GENERAL CHROMATOGRAPHY SUPPLIES

Minimize contamination and ensure accurate, reproducible results

As the world’s premier measurement company, Agilent is uniquely positioned to offer you the widest selection of parts and supplies. All are engineered or selected by our experienced design teams, manufactured to our demanding specifications, and tested under the strictest conditions.

• Vials, caps and septa are designed to work flawlessly with your autosampler’s gripping and injection mechanisms – eliminating breakage and leaks that can cause unnecessary downtime, expensive repairs, and sample loss. We have also expanded our portfolio to include MS analyzed kits, Agilent Certified Vials, and NEW Agilent CrossLab Vials for non-Agilent autosamplers.

• Manual and autosampler syringes boost performance along every step of your sampling process. Designed for accuracy, reliability and ease of use, Agilent syringes ensure exact measurement, transport, and delivery of liquids necessary for sample preparation and injection.

• Renewable gas purification system extends column life and reduces baseline noise by removing oxygen, water, and hydrocarbons from carrier gasses. One renewable cartridge can support up to four GC systems, while delivering the same filtration capacity as multiple competitive cartridges.

• Gas Clean filter system prevents dirty gas from jeopardizing your analysis. Oxygen, hydrocarbons, and moisture can decrease GC sensitivity; they can also activate glass wool in liners and accelerate septa degradation, causing high background noise and ghost peaks. Inserting a gas clean filter immediately before your GC inlet greatly reduces the level of impurities, improving trace analysis.

• Fittings and tools make life in the lab easier by keeping your instruments running in top form.

• Electrochemistry meters are designed by chromatographers for chromatographers to give you rugged simplicity and fast, reliable data. Features such as user-friendly controls, waterproof connectors, and multi-parameter measurement capabilities make Agilent pH, DO, ISE, conductivity and multi-parameter meters your first choice for a broad range of applications.

Agilent Solutions

PUT MORE THAN 40 YEARS OF RELENTLESS INNOVATION
BEHIND YOUR EVERY RESULT

By continually raising the standards for technologies that support your routine analyses, Agilent’s R&D efforts have led to breakthroughs such as:

• New GC columns that help you achieve higher levels of inertness and column-to-column reproducibility

• LC column choices that deliver the sensitivity and reliability you need for demanding applications

• Cutting-edge sample preparation products that promote reliable extraction and concentration

• Fresh atomic and molecular spectroscopy ideas for identifying and confirming targets and unknowns

Longtime Agilent customers have experienced our commitment firsthand. And now, we look forward to demonstrating how Agilent’s approach to relentless innovation can work to your advantage, too.

CHEMICAL ANALYSIS SOLUTIONS

Food

From high-volume screening of vegetables for large numbers of pesticides to rapid identification of pathogens, Agilent understands the analytical needs of food producers, shippers, and regulators. When a new toxin appears, we deploy substantial resources to quickly help customers develop robust and reliable methods. Agilent’s leading separations, mass spectrometry, and spectroscopy solutions are emerging as valuable food testing techniques.

Environmental

[picture] | Agilent offers more than 40 years of environmental testing and regulatory expertise. We help government and private labs with the full range of assays, from routine testing of soils for heavy metals to detection of pharmaceuticals in groundwater, in concentrations down to parts per trillion.

Energy and Fuels

Agilent collaborates closely with process industry customers to offer analytical systems that meet their needs for separation, detection, throughput, and support. We’ll even preconfigure custom or standard analyzers so they arrive at the lab ready-to-go. Agilent’s expertise in both chemical analysis and life science is a powerful combination for researching and producing biofuels, including a wide range of analytical techniques for fatty acid methyl esters (FAMEs). Our newly-expanded portfolio also offers powerful tools for developing and producing photovoltaic films and solar panels.

Forensics

Because the careers of world class athletes and many other individuals hinge on drug testing, it’s critical that those doing the testing have the highest level of confidence in the results. Forensics analysts worldwide have grown to depend on Agilent tools for accuracy, reliability, and speed in this high stakes, high-throughput field. Our best selling GC, GC/MS and popular LC and LC/MS are workhorses in forensics labs.

Traditional Lab Informatics

The ways labs generate and store data profoundly affect their efficiency. Agilent offers a rich, integrated suite of software products built on a set of customer-driven architectural values with the Agilent OpenLAB Laboratory Software Suite. OpenLAB delivers superior performance, open systems integration and investment protection. Our commitment is to deliver more value across each step in the life cycle of scientific data – from data collection and analysis to interpretation and management.

Materials Science

Agilent offers a newly expanded portfolio of instruments used for the research, manufacturing and testing of advanced materials, from precision optics to pulp, paper and polymers. Tools for chromatography, atomic absorption spectroscopy, molecular spectroscopy, X-ray crystallography, and nuclear magnetic resonance all support continuous progress in materials science.

LIFE SCIENCE SOLUTIONS

Biopharmaceutical

[picture] | As “multi-omics” studies gain momentum in the search for new therapeutics, Agilent is uniquely positioned to provide the instruments, reagents, and powerful software needed for performing experiments in multiple disciplines and combining the massive amounts of data into biological insight.

Pharmaceutical

Drug manufacturing requires the accuracy, sensitivity and high throughput of other analytical applications, along with the demands of regulatory record-keeping and validation requirements. Agilent provides a potent combination of rugged, high-throughput tools and unmatched compliance services. Agilent now offers the market-leading family of dissolution apparatus and sampling systems that pair perfectly with our HPLC and UV systems.

Proteomics

Research into how large sets of proteins affect the health of an organism requires special sets of analytical tools. Agilent has built a formidable arsenal of liquid chromatograph/mass spectrometers, bioinformatics systems, multiple affinity protein removal columns, and OFFGEL electrophoresis for protein identification and protein biomarker discovery. Accurate-Mass mass spectrometry and the microfluidic HPLC-Chip/MS are two Agilent innovations speeding the work of proteomics researchers around the globe.

Metabolomics

Collections of small molecules are increasingly being seen as rich sources of biomarkers, but studying metabolites presents many challenges. The need for speed, accuracy, and powerful interpretation capabilities in looking at chemical profile snapshots is underscored because molecules are constantly entering, leaving or changing within the metabolome. Agilent’s GC, LC, NMR and MS portfolios, along with our excellent bioinformatics offerings, user-customizable METLIN metabolite database for LC/MS, and the industry’s first commercial GC/MS retention time locked metabolite library align well with needs of metabolomics researchers.

Genomics

Agilent is a global leader in microarrays, scanners, and reagents used in a wide variety of genomic-based disease research experiments. Our SureSelect Target Enrichment System dominates the category, streamlining next generation sequencing studies worldwide. Agilent offers a wide range of catalog microarrays and a highly-developed capability to produce custom arrays featuring ink jet-based SurePrint fabrication and the eArray on-line design tool. All Agilent microarrays feature highly sensitive, selective 60-mer probes. With as many as eight arrays printed on a standard 1 × 3 in. slide, the cost per experiment becomes very affordable.

Life Science Informatics

Mirroring its extensive instrument portfolio, Agilent offers the industry’s most extensive suite of bioinformatics software, helping users derive knowledge from complex genomic, proteomic, metabolomic and other biological data. This includes DNA Analytics for analyzing CGH, ChIP and methylation microarray data. The GeneSpring suite includes informatics software for microarray-based gene expression data, genotyping data, and GeneSpring MS, which are useful for analyzing mass spec data from proteomics and metabolomics experiments and comparing complex datasets to explore biological questions from multiple perspectives.

Lab Automation

To meet the skyrocketing demand for more throughput and automation, Agilent has substantially expanded its lab automation offerings. The Agilent line of liquid handlers and microplate processors are designed to streamline high-volume life science workflows. Agilent is also continually upgrading its advanced autosamplers for LC, GC, LC/MS and GC/MS, adding functionality and speed to reflect the performance of its advanced instruments.

Vacuum Technology

Agilent works with customers to solve vacuum challenges from experiments in high-energy physics to developing systems for producing flat panel displays. Agilent manufactures vacuum systems used in its own mass spectrometry instruments as well as those of other manufacturers. Agilent’s vacuum technology has been proven by the most powerful physics experiment ever built, CERN’s Large Hadron Collider machine, which was used in the discovery of the Higgs boson particle.

Agilent Service and Support for Instrument Systems

Focus on what you do best

For over 40 years, Agilent has been building and maintaining the instruments you count on to stay competitive and successful. Trust us to protect your investment with a broad portfolio of services, backed by a global network of experienced service professionals dedicated to the productivity of your lab.

Get the Agilent Service Guarantee

Should your instrument require service while covered by an Agilent service agreement, we guarantee repair or we will replace your instrument for free.

No other company offers this level of commitment to keep your lab up and running at peak efficiency.

Laboratory decision makers and users ranked Agilent as their first choice for general laboratory compliance services.

Agilent Advantage Service Plans

The best service available for your Agilent instruments

Agilent offers a flexible range of service plans so that you can choose the level of coverage that is best for your lab.

• Agilent Advantage Gold – Priority-one coverage for ultimate uptime and productivity

• Agilent Advantage Silver – Comprehensive coverage for dependable laboratory operations

• Agilent Advantage Bronze – Total repair coverage at a fixed annual price

• Agilent Repair Service – Basic coverage for reliable instrument repair

Agilent Advantage service plans include Agilent Remote Advisor for real-time remote monitoring and diagnostics. Through secure internet connections, you can interact with Agilent service professionals, receive detailed asset reports, and configure text or email alerts to notify you before problems occur – helping you to maximize instrument uptime and optimize laboratory workflows.

Agilent Compliance Services

Equipment qualification that meets the most stringent requirements

Enterprise Edition Compliance was developed to streamline compliance across your entire lab. Used globally in regulated labs, including standards organizations and regulatory agencies, Enterprise Edition enables you to:

• Improve qualification efficiency by automating protocols across platforms to ensure greater efficiency and minimize regulatory risk

• Standardize your entire compliance operation with robust test designs that work with all your instruments

• Add, remove or reconfigure tests based upon your unique user requirements

• Significantly reduce staff review time with consistently formatted, computer generated, tamper-proof reports

Agilent Education and Consulting Services

Our best minds, working for you

Make the most of your instrument with training and consulting from the same experts who designed the instruments, software and processes you use every day.

• Classroom and on-site training in instrument operation, troubleshooting and maintenance

• Customized consulting services to meet your lab’s unique needs

The Agilent Value Promise – 10 Years of Guaranteed Value

In addition to continually evolving products, we offer something else unique to the industry – our 10-year value guarantee. The Agilent Value Promise guarantees you at least 10 years of instrument use from your date of purchase, or we will credit you with the residual value of the system toward an upgraded model. Not only does Agilent ensure a reliable purchase now, but we also ensure that your investment is just as valuable in the future.

For more detailed information,
please go to www.agilent.com/chem/services
or contact your local Agilent Services and Support representative.

Technical Support at work for you

Have a hardware, software, application, instrument repair or troubleshooting question? Agilent’s technical experts are available to answer your questions. With years of laboratory experience, our technical support specialists can provide in-depth knowledge and experience.

For questions pertaining to supplies found in this catalog, contact your local Agilent office or Authorized Agilent Distributor or visit www.agilent.com/chem/techsupport

Need more information?

Visit www.agilent.com/chem/contactus to:

• Locate your nearest Agilent office or distributor for expert technical support.

• Get fast sales and product assistance by phone. Simply use the scroll-down menu to select your country.

• Receive email assistance using our convenient online forms.

FEATURED PRODUCTS

Agilent Gas Clean Filters

The Agilent Gas Clean Filter System provides enhanced gas quality for maximum productivity. Clean gases reduce the risk of column damage, sensitivity loss, and instrument downtime. Oxygen, hydrocarbons and moisture can cause loss of sensitivity and accuracy of the GC, and damage your column and consumables. Inserting a Gas Clean Filter System in the gas line immediately before the instrument inlet greatly reduces the level of impurities and helps you detect any problems before they occur.

view here

Agilent Ultra Inert Solutions

Agilent is leading the way in flow path inertness with their industry-leading Agilent J&W Ultra Inert GC Column family and the Agilent Ultra Inert Liner. Whether you are analyzing difficult, active food and environmental samples or screening for drugs of abuse, our Ultra Inert solutions help ensure an inert GC flow path for higher sensitivity, accuracy, and reproducibility...especially at trace levels. For more information, visit www.agilent.com/chem/ultrainert

Agilent Electronic Crimper and Decapper

The Agilent Electronic Crimper and Decapper is much easier to use than a manual crimper, and is more likely to give you a secure seal every time. The crimper also increases lab productivity because you don’t waste time refixing poor seals and cleaning up broken glass and spilled samples. You can also be confident that you do not risk losing potentially valuable samples.

view here

Agilent Syringes

Whether you need an autosampler or manual syringe, there are two key features consider when choosing the right syringe – identifying your sample type and establishing the smallest volume to be dispensed or injected. Agilent offers syringes for all sample types in all the dimensions you are ever likely to need, for accurate and effective sampling.

view here

Agilent CrossLab Supplies

Agilent CrossLab is a growing portfolio of GC and LC supplies critical to instrument performance and productivity. They are manufactured to perform seamlessly with a variety of analytical instruments in your lab, regardless of make or model. When you choose Agilent CrossLab, you know you’ll get:

• Over 40 years of chromatography expertise and on-going innovation

• The same commitment to quality inherent in all Agilent products

• Optimal performance for routine and challenging applications

• Convenience of consolidated purchasing

All with our risk-free, 90-day, money-back guarantee.

Agilent CrossLab HPLC supports instruments from Waters, Shimadzu, Dionex (now part of Thermo Scientific), CTC Analytics, and more. The comprehensive range includes detector lamps, autosampler vials and closures, well plates and sealing mats, autosampler syringes, pump and valve supplies, capillaries, tubing, and fittings, and performance maintenance kits. Put Agilent CrossLab HPLC quality supplies to work across your lab.

Agilent CrossLab GC works with instruments from Bruker (formerly Varian), CTC Analytics, PerkinElmer, and Shimadzu, with more on the way. The family comprises autosampler syringes to autosampler vials, Agilent Ultra Inert inlet liners to non-stick liner O-rings, capillary column ferrules to column nuts, vials, caps, septa, and more. Experience the same Agilent quality solutions you know and trust, now for your non-Agilent GCs.

All Agilent Crosslab high quality supplies are backed by Agilent’s worldwide technical support and dependable availability and delivery.

For information on Agilent CrossLab Vials, view here
For information on Agilent CrossLab Syringes, view here

Agilent Vials and Closures

Common questions about Agilent vials and caps

Why is it important to use Agilent Certified vials on my Agilent autosampler?

Agilent Certified vials are the only vials in the industry designed and tested for full compatibility with our autosamplers. The same attention and precision that go into designing our instruments, columns, and parts also go into designing these vials. Many Agilent autosamplers use a robotic arm to grip vials by the neck. Therefore, it is critical that the vial neck and shoulder are the proper height to prevent dropped vials and lost samples. Only Agilent Certified vials are designed for use on Agilent autosamplers; competitor products simply do not meet our exact specifications, which can lead to costly instrument downtime and potential loss of your precious samples.

Is the same true for Agilent Certified caps and inserts?

To avoid leakage and sample loss due to evaporation, inserts must sit neatly in the vial – and the entire assembly must be tightly sealed when capped. You should also consider the depth of your autosampler needle when using an insert to prevent needle damage and ensure proper sample uptake.

The threads on the Agilent Certified screw vials are designed precisely to match the threads on Agilent Certified caps. Using a non-Agilent Certified cap on these vials will not create a secure, tight seal and will lead to sample loss. In addition, Certified crimp vials and caps are tested over 100,000 times on our Agilent autosamplers to confirm a proper fit and secure seal.

Do I need to be concerned about the compatibility of my sample with my vials?

For highly sensitive samples such as pesticides or semivolatiles, as well as samples that are prone to sudden shifts in pH, deactivated vials are best, because their surface is more hydrophobic and inert. For more exacting, demanding applications, such as mass spectrometry, deactivated vials are recommended to prevent sample interactions prior to analysis.

Polypropylene vials are an excellent choice for biological applications and for applications involving samples with high metal content, such as ion chromatography, AA, or ICP-MS. Agilent thoroughly tested and evaluated a variety of polypropylene materials prior to selecting the grade used in our polypropylene vials. Our polypropylene vials have the lowest levels of extractables to ensure integrity of your sample.

Can I count on consistency from one vial to the next?

Autosampler vials can vary from their stated size and wall weight if tolerances are not tightly controlled. This can affect the volume of sample in the vial, which is especially problematic when working with small amounts of sample. Our tight control of tolerances extends through the entire manufacturing process, from the initial design to the final opto-electronic screening process, which inspects every single vial and cap for accuracy.

Agilent Certified vials conform to the industry’s tightest tolerances to ensure consistency from lot to lot, as well as from one vial to the next.

Why should I buy my vials from Agilent?

Vial integrity, cleanliness, and consistency are critical for today’s demanding applications. That is why Agilent vials and caps are designed using the same engineering expertise that is built into Agilent instruments. All Agilent Certified vials are manufactured in ISO 9001 clean environments, must pass a 33-point visual inspection, and are uniquely packaged to stay clean and secure during shipment.

Why It Is Critical to Use Agilent Certified Vials and Closures on Agilent Autosamplers
Common Problems | Effects | Benefits of Agilent Certified Vials and Caps
Inconsistency with vial bottom thickness | • Sample draw inconsistency | Consistent and valid relative standard deviation (RSD) values
| • Damaged needle |
Autosampler sequence interruption | • Mishandled or dropped vials | Confidence in unattended operation
| • Loss of precious sample |
Undetected improper seal | • Sample loss/evaporation | Proper sealing for accurate results
| • Possible sample contamination |
Dislodged or misaligned septa | • Sample loss | Accurate results
| • Sample contamination |
Ghost peaks | • Contamination by cap septa | Chromatographic purity test that eliminates outliers and analysis errors

TIPS & TOOLS |

Agilent has made vial, cap and septum selection easy with its new Interactive Vial Selection Tool, available online in both desktop and mobile versions. The tool identifies the right vial and closures for your particular application, and provides the rationale for the choices offered. Visit www.agilent.com/chem/SelectVials

Protect sample integrity by choosing the right septa for your application

Proper septa selection is critical to preventing contamination and avoiding damage to the needle and instrument. Here are some questions you should ask:

Are the septa chemically compatible with your samples and solvents?

The chart below summarizes chemical compatibility and incompatibility. Agilent provides this septa compatibilty as a guide and a starting reference point. We realize that chemical compatibility can vary depending on the concentration of the solvent, the temperature, the molecular weight of the solvent, and other factors. Therefore it is always recommended you try a variety of septa to determine the best one for your analysis.

Will my application require repeat injections from the same vial or storage of the sample?

Resealability is an important factor to consider when selecting septa. PTFE/red rubber septa are not recommended for multiple injections or for samples that need to be stored for further analysis. When applications require a longer time between injections or any type of standard additions, PTFE/silicone/PTFE septa are always best.

What force is required to penetrate the septa?

Generally, silicone septa are more easily pierced than red rubber or butyl septa. For thicker, hard-to-pierce septa, a small gauge (23 gauge) needle may be required. Or an S-needle as they are stronger.

Pre-slit septa are the best option for the easiest penetration and will reduce the likelihood of coring.

All Agilent Certified septa are designed for optimal use with Agilent autosamplers and for proper fit in the caps.

TIPS & TOOLS |

Agilent has made vial, cap and septum selection easy with its new Interactive Vial Selection Tool, available online in both desktop and mobile versions. The tool identifies the right vial and closures for your particular application, and provides the rationale for the choices offered. Visit www.agilent.com/chem/SelectVials

What temperature range does my application require?

Septa can degrade at higher temperatures, causing contamination of your samples. Red rubber septa are only stable up to 90 °C and therefore are not a good option for higher temperature applications. Generally, PTFE-lined silicone septa provide the best compatibility with a wide range of temperatures.

For newer headspace applications that require temperatures up to 300 °C, Agilent offers the new High Performance Septa, made of special proprietary materials that minimize degradation at extreme temperatures.

How do I avoid common issues caused by septa?

Coring

Coring occurs when the needle diameter is too large for the septa or when the septa material is not durable enough to withstand repeat injections. When this happens, septa material can flake off into the vial and contaminate the sample. Here is how to prevent coring:

• Choose a PTFE-lined septum to prevent septa material from entering the sample

• Make sure the needle is not damaged, and consider a side-entry needle instead of a conical needle

• Use pre-slit septa, which will virtually eliminate coring

Vacuum Generation

Sometimes withdrawing volume from a sealed vial can create a vacuum. A few simple steps can prevent this from happening:

• Use pre-slit septa to help equalize the pressure on both sides of the cap

• Do not overfill vials

• Do not take more than 50 μL (from a 2 mL vial) in one injection

| TIPS & TOOLS
[picture] | For highly sensitive samples, we recommend PTFE-lined (“sandwiched”) septa, because the PTFE layers act as a chemically resistant barrier.

| TIPS & TOOLS
[picture] | Septa that are too thick can prevent the cap from fitting properly on the vial. Agilent Certified septa are designed for use in our Certified caps.

Agilent Vial Identification Chart and Actual Fill Volumes

MS Analyzed Vial Kits

Agilent MS Analyzed Vial Kits end the need to pre-test or to re-run samples due to unexpected peaks. All MS Analyzed Vial Kits include a Certificate of Analysis that contains accurate, lot-specific, and fully traceable LC/MS and GC/MS signal traces, as well as critical physical dimensions. Agilent’s new MS Analyzed Vial Kits provide lot-specific test results for greater confidence in your results.

• All vials are lot-tested by both GC/MS and LC/MS using Agilent systems

• Manufactured for full-warranted compatibility with Agilent GC and LC autosamplers

• Packaged in a unique box designed to reduce vial breakage

• Packed in a clean environment using clean packaging to reduce contamination

• Available in both crimp top and screw top closures

• Larger write-on spots for easier labeling and identification

• Conveniently packaged in a combination pack with 100 vials and 100 caps/septa

Screw top MS analyzed vial kit, 5190-2277

Screw top MS analyzed vial kit, 5190-2280

Crimp top MS analyzed vial kit, 5190-2282

Certificate of Analysis signed by Agilent’s Quality Manager

Certified Screw Top Vials and Closures

Combine the excellent autosampler handling of a crimp cap profile with the ease of a screw cap. The screw caps and precision fit septa give a secure seal with microvolume inserts.

• Certified for full warranted compatibility with Agilent autosamplers

• 2 mL, 12 × 32 mm, 9 mm diameter

• Packaged in a unique box designed to reduce vial breakage

• 40% larger opening than standard narrow opening vials

• Unique thread design for consistently secure seal

• Precision-formed neck for optimal robotic arm handling

• Rigorous quality assurance for dimensional consistency from lot-to-lot

• Optional ceramic write-on spot with fill marks

2 mL Wide Opening Screw Top Glass Vials
Description | 100/pk | 1000/cs*
Clear | 5182-0714 | 5183-2067
Clear, write-on spot | 5182-0715 | 5183-2068
Amber | 5188-6535 | 5188-6536
Amber, write-on spot | 5182-0716 | 5183-2069
Deactivated Vials
Clear | 5183-2070 |
Clear, write-on spot | 5183-2071 |
Amber, write-on spot | 5183-2072 |

*Case includes 10 packs of 100 vials

LC Vials and Closures
Description | Unit | Part No.
6 mL Screw Top Vials and Closures |  |
Clear, flat bottom | 100/pk | 9301-1377
Screw caps, 16 mm | 100/pk | 9301-1379
PTFE/silicone septa | 100/pk | 9301-1378
PTFE/silicone septa, pre-slit | 100/pk | 5188-2758
5 mL Screw Top Vials |  |
Clear, high recovery | 30/pk | 5188-5369

PTFE-lined solid top screw caps for 2 mL vials, 5183-2075

Polypropylene caps with bonded septa, 5185-5823

Screw caps with septa

Certified Septa for Wide Opening (9 mm) Screw Caps
Septa Type | Color | 100/pk
PTFE/red silicone | Ivory | 5182-0731
PTFE/white silicone/red PTFE | Red | 5182-0729
Pre-slit PTFE/white silicone | Blue | 5183-2074
PTFE/white silicone | Red | 5182-0730

Screw Cap Pack for 7696 Sample Prep Workbench
Description | Septa Type | Part No.
Multicolor screw cap pack Includes 50/pk of each color: blue, green, red, light turquoise, purple | PTFE/silicone septa | 5040-4682

Certified 2 mL Screw Top Vial Packs

Pre-assembled packs come ready-to-use with the cap and septum of your choice attached to the vial. A time- and labor-saving product for use with your Agilent autosampler or any rotating tray automatic sampler.

Pre-assembled vial pack

Certified Screw Top Vial Convenience Packs

Convenience packs are an easy way to get 500 of each component using one part number. Packed in our six-drawer, reusable blue plastic cabinet, 500 vials and caps with septa installed are kept handy and dust-free.

Screw top vial convenience kit

Crimp Top Vials and Closures

The wide opening crimp cap provides a larger target area for improved autosampler needle accuracy. Select from five cap colors and a variety of septa. Whatever your crimp top vial needs, Agilent has what you are looking for.

• Certified for full warranted compatibility with Agilent autosamplers

• 2 mL, 12 × 32 mm

• Available in unique packaging designed to reduce vial breakage

• Tightly controlled crown for improved crimping

• Precision-formed neck for improved autosampler handling

• Rigorous quality assurance provides dimensional consistency from lot-to-lot

• Optional ceramic write-on spot with fill marks

Clear crimp top vials, 5181-3375

LC Vials and Closures
Description | Unit | Part No.
6 mL Crimp Top Vials and Closures |  |
Clear, flat bottom | 100/pk | 9301-1419
Crimp caps, 20 mm, PTFE/silicone septa | 100/pk | 9301-1425

Crimp Caps with 11 mm Septa

Agilent recommends using Certified crimp caps with PTFE/silicone septa to ensure seamless operation with your Agilent autosampler. Agilent Certified crimp caps are guaranteed to work with your instrument to reduce autosampler malfunctioning and contamination.

Magnetic crimp caps, 5188-5386

| TIPS & TOOLS
[picture] | Red rubber septa have a tendency to cause needle sticking during sampling. Agilent recommends a 23/26 gauge needle when using red rubber septa. Agilent Certified crimp caps are compatible with all needle types.

Certified Microvolume Inserts for Wide Opening Vials

To meet your microsampling needs, Agilent has a variety of microvolume inserts with capacities and designs that can transform our vials from full-capacity to limited volume with one simple step. Microvolume inserts are certified to work with all Certified vials for excellent fit with Agilent autosamplers.

250 μL pulled-point glass inserts, 5183-2085

400 μL glass flat bottom inserts, 5181-3377

Polypropylene Vials

Wide opening 12 × 32 mm vials are manufactured from virgin polypropylene, meeting the requirements of 21 CFR 177.1520. Polypropylene is chemically resistant and the material of choice for sodium or heavy metals analysis. Polypropylene vials are translucent and can be used with crimp caps.

Agilent’s polypropylene vials use the purest, cleanest grade of polypropylene available, to guarantee the lowest levels of extractables. In addition, the walls of these vials have been thickened to withstand the force of Agilent LC and CE autosamplers. Competitor vials are not comparable.

Crimp/Snap top polypropylene vial, 250 μL. 5188-2788

When should I use a Polypropylene Vial?

The information provided below will help you to determine if polypropylene vials or silanized glass vials are the best option for your application. As always, this information serves only as a guideline, and we always recommend testing options before deciding on the proper vial and cap.

Polypropylene

Polypropylene vial with glass insert, 9301-0977

• Traditionally the material of choice for LC or LC/MS and CE

• Polypropylene can oxidize some biologicals

• Not recommended for light sensitive compounds

• Not compatible with a number of organic solvents

• Max temperature of ~ 175 °C

Available Sizes/Formats
Polypropylene Vials |
250 μL | Crimp & Screw
Deactivated/Silanized Vials |
2 mL | Crimp, Snap & Screw
250 μL, 400 μL | Microvolume Inserts

| TIPS & TOOLS
[picture] | The Agilent headspace autosamplers G1888A, and 7694A, B and E are compatible with the flat bottom headspace vials only. Only Agilent vials are designed to properly fit in the Agilent autosampler incubator.

Deactivated/Silanized Vials

• Deactivation process renders surface inert

• Will not interact with metals, biologicals or proteins and will not cause shifts in pH of sample

• Compatible with a wide variety of solvents

• Available in amber for light sensitive samples

• More expensive than polypropylene

• Can withstand temperatures up to 500 °C

Headspace Vials and Closures

Beveled-neck headspace vials are available in both 10 mL and 20 mL capacities, flat or rounded bottom. The 20 mm crimp caps provide a consistently secure seal. Agilent also offers cost-saving convenience packs with vials, caps and septa packaged together.

• Certified for full warranted compatibility with Agilent autosamplers

• Choice of crimp or screw top vials

• Beveled top for maximum secure seal

• Two neck lengths available

• Choice of a pressure safety release cap at 45 psi

• Available in flat or rounded bottom designs

Clear headspace crimp top vials with graduation marks and write-on spot, 5190-2285

Amber headspace crimp top vials with graduation marks and write-on spot, 5190-2288

High Performance Septa

Agilent introduces the first septa that can withstand extreme temperatures and conditions for today’s demanding headspace applications.

• Proven to withstand temperatures up to 300 °C with no degradation

• Leakproof

• Available in your choice of crimp or screw

Headspace screw top vial blank chromatogram comparison at 300 °C with different septa

GC/MS conditions
Inlet: | Split mode w/ 10:1 ratio, 250 °C
Column: | DB-5ms Ultra Inert, 30 m × 0.25 mm, 0.25 μm, Constant flow: 2.5 mL/min
Oven: | 40 °C hold 1.5 min, then 15 °C/min to 325 °C and hold for 2.5 min, 23 min total run time
Thermal Aux/MS source/MS guard: | 250 °C/230 °C/150 °C
MSD: | Scan mode 25 - 550 m/z

Vial blank sample chromatogram at 300 °C with Agilent High Performance HS Septa

Agilent High Performance Septa provide significant cleaner blank background at high temperature HS testing. Even with small abundance scale, the 300 °C vial blank chromatogram with High Performance Septa only shows few siloxane peaks with very small abundance.

Headspace conditions
Septa Type: | Agilent High Performance Septa, 5190-3986
Temperature: | Oven/loop & valve/transfer line: 300 °C/300 °C/300 °C
Times: | GC cycle time: 32 min, Vial equib time: 30 min
Vial: | Fill pressure: 15 psi, Fill flow: 50 mL/min, Loop fill ramp rate: 20 psi/min, Loop final pressure: 10 psi, Vial Size: 20 mL, Shaking: 1
Carrier: | GC controlled

[picture] | TIPS & TOOLS For information on CrossLab High Performance Septa, view here.

Aluminum crimp caps, 5183-4477

Headspace vial convenience kit

[picture] | TIPS & TOOLS For information on CrossLab Headspace Vial Convenience Packs, view here.

CombiPAL Headspace Vials and Closures

Screw top vials and caps are recommended for the tightest seal and the most reproducible headspace results. CombiPAL headspace vials and caps are precision-threaded, making them an excellent choice for dependability and ease-of-use. They are ideal for applications in the environmental, food and beverage, industrial hygiene, drug analysis, and clinical chemistry industries.

CombiPAL Headspace Screw Top Vials
Description | 100/pk
10 mL, 23 × 46 mm |
Clear | 5188-5392
Amber | 5188-6538
20 mL, 23 × 75 mm |
Clear | 5188-2753
Amber | 5188-6537

CombiPAL 18 mm Screw Top Caps with Septa
Cap Color | Septa Type | 100/pk
Silver aluminum, magnetic | PTFE/silicone septa (top white, bottom blue) | 5188-2759

Snap Top Vials and Closures

Snap top vials and caps are the simple, efficient way to a secure seal without crimping. It’s as easy as push-on, pull-off. Crimp caps can also be used with wide opening snap top vials. Note: Snap cap vials cannot be pressurized.

• 2 mL, 12 × 32 mm

• Use with any 11 mm snap or crimp cap

• Available in unique packaging designed to reduce vial breakage

• Provides a total seal around the entire circumference of the vial crown

• Precision-formed neck improves autosampler handling

• Optional ceramic write-on spot

• Uniformly flat bottom ensures compatibility with inserts

Snap top vials with fixed inserts

2 mL (11 mm) Snap Top Glass Vials
Description | 100/pk | 1000/cs*
Clear | 5182-0544 | 5183-4504
Clear, write-on spot | 5182-0546 | 5183-4505
Amber, write-on spot | 5182-0545 | 5183-4506
Deactivated Vials |  |
Clear | 5183-4507 |
Clear, write-on spot | 5183-4508 |
Amber, write-on spot | 5183-4509 |
Snap Top Vials with Fixed Inserts |  |
Clear, 300 μL useable volume | 5188-6593 |
Amber, 300 μL useable volume | 5188-6594 |

*Case includes 10 packs of 100 vials

Snap caps with septa

Specialty Vials and Closures

High Recovery Glass Vials

Wide opening, 1.5 mL vials with 30 μL reservoir are for sample concentration and injection without transferring to microvolume inserts.

Crimp top vial, high recovery, 5182-3454

Micro-V Vials

• Wide opening, 1.5 mL vials with low residual volume

• Made from first hydrolytical glass Type 1

• Standard 12 × 32 mm dimension

• Compatible with 11 mm crimp closures

• Lower cost alternative to high recovery vials

Micro-V Vial, snap top, 5184-3552

Standard Opening Screw Top Vials, Closures and Inserts

The original, smaller opening vials with an 8-425 thread-size screw cap are available with black caps and a variety of septa to meet the needs of your application.

• 2 mL, 12 × 32 mm, 8 mm diameter

• 8-425 thread design

• Original, standard neck size

Screw top vials, closures and inserts

2 mL Standard Opening (8 mm) Screw Top Glass Vials
Description | Unit | Part No.
Clear | 100/pk | 5183-4428
Amber | 100/pk | 5183-4429
Clear, PTFE-lined storage cap | 100/pk | 5183-4518
Deactivated Vials |  |
Clear | 100/pk | 5183-4432
Amber | 100/pk | 5183-4433

Microvolume Inserts for Standard Opening (8 mm) Vials
Description | Unit | Part No.
Conical Inserts with Polymer Feet |  |
150 μL glass inserts with polymer feet | 100/pk | 5183-2088
Conical Glass Inserts |  |
150 μL pulled-point interior glass inserts | 100/pk | 5183-2089
Flat Bottom Inserts |  |
250 μL glass flat bottom inserts | 100/pk | 5183-2090

8-425 screw top vials

4 mL (13 mm) Screw Top Vials and Closures

• 4 mL, 15 × 45 mm

• Precision-formed screw threads (13 × 425) for consistently secure seal

• Can be used as wash, waste, or storage vials

4 mL screw top vials

4 mL (13 mm) Screw Top Glass Vials
Description | Unit | Part No.
Clear | 100/pk | 5183-4448
Clear with write-on spot | 100/pk | 5067-0246
Amber | 100/pk | 5183-4450
Amber with write-on spot | 100/pk | 5067-0247

Caps and Septa for 4 mL (13 mm) Vials

Caps and Septa for 4 mL (13 mm) Vials
Description | Unit | Part No.
Black 13 × 425 caps, PTFE/silicone septa | 100/pk | 5183-4464
Black 13 × 425 open top screw caps | 100/pk | 5183-4461
Diffusion inserts used with black open top screw caps | 12/pk | 07673-40180
PTFE/natural rubber septa | 144/pk | 9301-1031
Red PTFE/white silicone septa | 100/pk | 5183-4460
White virgin PTFE septa | 1000/pk | 5183-4459

4 mL (13 mm) Screw Top Convenience Packs
Description | Unit | Part No.
Clear vials with caps (no septa) | 144/pk | 9301-0723
4 mL wash vials with fill markings and caps | 25/pk | 5182-0551

General Purpose Sample Storage Vial and Caps

Agilent caps and vials are ideal for sampling and storage. Caps are lined with PTFE/silicone for excellent sealability and chemical resistance. All caps include bonded septa that will prevent liner fallout during shipping and sampling. Caps are manufactured of high quality materials to eliminate sample contamination.

Sample vial pack

Sample storage vial kit, 5183-4324

Crimping and Decapping Tools

Electronic Crimpers and Decappers

Designed to replace awkward and bulky manual crimping pliers, the Agilent electronic handheld crimpers give tight, reproducible seals every time. Adjustable, slim steel jaws fit around closely spaced vials, enabling you to crimp vials directly in crowded autosampler trays. Using the same handheld design as the crimpers, Agilent’s electronic decappers remove caps instantly and are designed for laboratories that recycle or reuse vials.

11 mm electronic crimper, 5190-3188

• More vials crimped per battery charge – new lithium ion battery lasts three times longer

• Increased crimping speed – new model is 50% more powerful (6.4 volt battery)

• Less hand strain – lighter weight means less effort

• Improved power signal – clearly shows when battery needs recharging

• Easily used in right or left hand – display on top for easier viewing

• More efficient charging – no overheating during recharging

• Extended productivity – significantly longer motor life

20 mm electronic crimper, 5190-3189

Electronic Crimpers and Decappers
Description | Part No.
11 mm electronic crimper with lithium battery | 5190-3188
20 mm electronic crimper with lithium battery | 5190-3189
11 mm electronic decapper with lithium battery | 5190-3190
20 mm electronic decapper with lithium battery | 5190-3191
Replacement lithium battery for crimper and decapper | 5190-3192
High Power Electronic Crimping Tool with Power Supply | 5190-4061
11 mm Crimper Jaw Set for HP Electronic Crimper | 5190-4062
11 mm Decapper Jaw Set for HP Electronic Crimp tool | 5190-4063
20 mm Crimper Jaw Set | 5190-4064
20 mm Decapper Jaw Set | 5190-4065
Base for Electronic Crimping Tool | 5190-4066
20 mm HP Crimping Tool and Jaw Sets Bundle | 5190-4067

11 mm electronic decapper, 5190-3190

20 mm electronic decapper, 5190-3191

Manual Crimpers and Decappers

Agilent’s ergonomic manual crimpers and decappers remove the pain and discomfort of wrist strain with a lightweight, tailored design. Weighing 25-30% less than predecessors and eliminating sore, pinched hands, the new design dramatically improves your experience. Extensively tested with Agilent vials for optimal fit, and color-coded for ease-of-use, this tool is a necessity for every lab. The new crimpers are built for lasting performance: the 11 mm crimper will cap at least 100,000 caps and the 20 mm at least 60,000 before wear starts to impact performance.

• Comfortable, lightweight, ergonomically designed handles fit smoothly in the hand and eliminate pinching

• Top-mounted adjustment knob shows directionality for tightening/loosening

• Adjustment knob doubles as an indicator that the crimp (or decap) is complete

• Crimpers are color-coded with blue knobs and labels, decappers with orange

• Narrow jaws provide better vertical clearance over vials

• Bottom handle motion allows for better control and enhanced stability of crimping jaw

• Sturdy construction of rugged, fiber-reinforced resin with steel reinforcement in the handles

Manual Crimpers and Decappers
Description | Part No.
Ergonomic manual crimper for 11 mm caps | 5040-4667
Ergonomic manual decapper for 11 mm caps | 5040-4668
Ergonomic manual crimper for 20 mm caps | 5040-4669
Ergonomic manual decapper for 20 mm caps | 5040-4671

Ergonomic manual crimper, 5040-4667

CrossLab Vials and Closures

Agilent CrossLab vials and closures are thoroughly tested to ensure the highest level of quality. Additionally, CrossLab vials are designed for use in a wide range of non-Agilent GCs and LCs, including those from Bruker (formerly Varian), Dionex (now Thermo Scientific), PerkinElmer, Shimadzu, and Thermo Scientific. They are:

• Manufactured in an ISO 9001 certified facility

• Made from First Hydrolytic Type 1 Class A or Class B borosilicate glass, which conforms to US FDA, USP, and EU Pharmacopeia standards

• Protected by proprietary packaging with a crush barrier to reduce vial breakage

• Packaged in material that has been tested and selected for cleanliness

• Subjected to rigorous end-of-line sampling and quality control procedures to ensure all vials remain within specifications

• Compatible with a wide variety of autosamplers regardless of make and model

CrossLab Vials and Closures

The table below illustrates that the Agilent CrossLab vial portfolio is compatible with a wide range of HPLC and GC autosamplers.

Agilent CrossLab Vial Identification Chart with Recommended Fill Volumes

The Agilent CrossLab vial identification chart below provides a quick reference on vial dimensions, fill volumes, and Agilent CrossLab part numbers for a variety of vials, along with the recommended closures, for both HPLC and GC autosamplers.

Agilent provides this septa compatibility information as a guide and starting reference point. We realize that chemical compatibility can vary depending on the concentration of the solvent, temperature, molecular weight of the solvent, and other factors. Therefore, it is always recommended that you try a variety of septa to determine the best one for your analysis.

To obtain an optimal fit and seal of any vial and closure, we strongly recommend buying an entire CrossLab vial assembly (including a vial, cap, and septum, as well as a vial insert if needed). Please avoid mixing and matching any CrossLab vials with any other brand of closures, or any CrossLab closures with any other brand of vials.

CrossLab Headspace Vials and Closures

• Choice of crimp or screw top vials

• Bevelled top for maximum secure seal

• Choice of a pressure safety release cap at 45 psi

• Available in flat or rounded bottom designs

• New high performance septa designed for temperatures up to 300 °C

Headspace crimp top vials, 8010-0029

Headspace crimp top glass vials, 8010-0033

Headspace Screw Top Glass Vials
Description | Unit | Rounded Bottom CrossLab Part No.
10 mL Headspace Screw Top Glass Vials |  |
Clear, flat bottom | 100/pk | 8010-0038
Amber, flat bottom | 100/pk | 8010-0040
20 mL Headspace Screw Top Glass Vials |  |
Clear, flat bottom | 100/pk | 8010-0042
Amber, flat bottom | 100/pk | 8010-0044

To obtain an optimal fit and seal of any vial and closure, we strongly recommend buying an entire CrossLab vial assembly (including a vial, cap, and septum, as well as a vial insert if needed). Please avoid mixing and matching any CrossLab vials with any other brand of closures, or any CrossLab closures with any other brand of vials.

22 mL Headspace Crimp Top Glass Vials
Description | Unit | Agilent CrossLab Part No.
Clear | 100/pk | 8010-0152

Use 20 mm crimp caps with 6 mL and 22 mL headspace vials

6 mL Headspace Crimp Top Glass Vials
Description | Unit | Agilent CrossLab Part No.
Clear | 100/pk | 8010-0151

Use 20 mm crimp caps with 6 mL headspace vials

TIPS & TOOLS |
Many Agilent CrossLab vials are printed with graduation marks and write-on spots. Barcoding labels are also available for regular temperature and high temperature headspace applications. | [picture]

High Performance Septa

The first septa that can withstand extreme temperatures and conditions for today’s demanding headspace applications.

• Proven to withstand temperatures up to 300 °C for one hour with minimal degradation

• Leak proof

• Available in your choice of crimp or screw

• Compatible with all common headspace solvents including DMSO, DMF, Tolulene, and Water

• Fits PerkinElmer and other headspace autosamplers

Headspace aluminum crimp caps with PTFE/silicone septa, 8010-0144

[picture] | TIPS & TOOLS For further information on High Performance Septa, view here.

CrossLab Screw Top Vials and Closures

Combine the excellent autosampler handling of a crimp cap profile with the ease of a screw cap. CrossLab screw caps and precision-fit septa give a secure seal with microvolume inserts.

2 mL Wide Opening (9 mm) Screw Top Vials and Closures

• 2 mL, 12 × 32 mm, 9 mm diameter

• Available in unique packaging designed to reduce vial breakage

• Wider opening prevents syringe problems

• Unique thread design for consistently secure seal

• Precision-formed neck for optimal robotic arm handling

• Optional ceramic write-on spot with fill marks

Clear, 2 mL wide opening (9 mm) screw top glass vials, 8010-0015

2 mL Wide Opening (9 mm) Screw Top Glass Vials
Description | Unit | Agilent CrossLab Part No.
Clear | 100/pk | 8010-0015
Clear, write-on spot | 100/pk | 8010-0014
| 1000/cs | 8010-0175
Amber | 100/pk | 8010-0017
Amber, write-on spot | 100/pk | 8010-0016
| 1000/cs | 8010-0176
Screw Top Vials with Fixed Inserts |  |
Clear, 300 μL insert volume | 100/pk | 8010-0008
Amber, 300 μL insert volume | 100/pk | 8010-0009

Wide opening screw top vials with write-on spot, 8010-0014

Orange screw caps with PTFE/silicone septa for wide opening (9 mm) vials, 8010-0084

Septa for wide opening screw caps, 8010-0094

2 mL Standard Opening (8 mm) Screw Top Vials and Closures

• 2 mL, 12 × 32 mm, 8 mm diameter

• 8-425 thread design

• Optional ceramic write-on spot with fill marks

2 mL Standard Opening (8 mm) Screw Top Glass Vials
Description | Unit | Agilent CrossLab Part No.
Clear | 100/pk | 8010-0011
Clear, write-on spot | 100/pk | 8010-0010
Amber | 100/pk | 8010-0013
Amber, write-on spot | 100/pk | 8010-0012

Clear 2 mL wide opening (8 mm) screw top glass vials, 8010-0011

Screw caps for standard opening vials, 8010-0056

Septa for Standard Opening (8 mm) Vials
Septa Type | Unit | Agilent CrossLab Part No.
Red PTFE/white silicone/red PTFE | 100/pk | 8010-0071
Red PTFE/white silicone | 100/pk | 8010-0072
PTFE/butyl | 500/pk | 8010-0073

4 mL (13 mm) Screw Top Vials and Closures

• 4 mL, 15 × 45 mm

• Compatible with WISP 48 style autosamplers

• Precision-formed screw threads (13 × 425) for consistently secure seal

• Can be used as wash, waste, or storage vials

Black screw caps with red PTFE/silicone septa for 4 mL (13 mm) vials, 8010-0095

4 mL (13 mm) Screw Top Glass Vials
Description | Unit | Agilent CrossLab Part No.
Clear | 100/pk | 8010-0020
Amber | 100/pk | 8010-0021

Septa for 4 mL (13 mm) Vials
Septa Type | Unit | Agilent CrossLab Part No.
Red PTFE/white silicone | 100/pk | 8010-0098
White PTFE | 100/pk | 8010-0099
Pre-slit PTFE/silicone | 100/pk | 8010-0557

6 mL (16 mm) Screw Top Vials and Closures

Screw caps for 6 mL (16 mm) vials

6 mL (16 mm) Screw Top Glass Vials
Description | Unit | Agilent CrossLab Part No.
Clear | 100/pk | 8010-0022

Screw Caps for 6 mL (16 mm) Vials
Septa Type | Unit | Agilent CrossLab Part No.
PTFE/silicone | 100/pk | 8010-0101
Pre-slit PTFE/silicone | 100/pk | 8010-0102
Open top, no septa | 100/pk | 8010-0100

10 mL (22 mm) Screw Top Vials and Closures

10 mL (22 mm) Screw Top Glass Vials
Description | Unit | Agilent CrossLab Part No.
Clear | 100/pk | 8010-0563

Septa for 10 mL (22 mm) Vials
Septa Type | Unit | Agilent CrossLab Part No.
PTFE/silicone | 100/pk | 8010-0564

CrossLab Crimp Top Vials and Closures

The wide opening crimp cap provides a larger target area for improved autosampler needle accuracy. Select from a variety of cap colors and septa. Whatever your crimp top vial needs, Agilent has what you are looking for.

2 mL (11 mm) Crimp Top Vials and Closures

• 2 mL, 12 × 32 mm

• Available in unique packaging designed to reduce vial breakage

• Tightly controlled crown for improved crimping

• Precision-formed neck for improved autosampler handling

• Rigorous quality assurance provides dimensional accuracy from lot to lot

• Optional ceramic write-on spot with fill marks

Crimp top glass vials with write-on spot, 8010-0001

2 mL (11 mm) Crimp Top Glass Vials
Description | Unit | Agilent CrossLab Part No.
Clear | 100/pk | 8010-0002
Clear, write-on spot | 100/pk | 8010-0001
| 1000/cs | 8010-0170
Amber, write-on spot | 100/pk | 8010-0003
| 1000/cs | 8010-0172
Crimp Top Vials with Fixed Inserts |  |
Clear, 300 μL insert volume | 100/pk | 8010-0006
Amber, 300 μL insert volume | 100/pk | 8010-0007

TIPS & TOOLS

Agilent offers ergonomic manual crimpers and decappers, designed to significantly reduce hand strain. Electronic versions are also available, featuring a longer life battery designed for quick, powerful use. For more information, please visit www.agilent.com/chem/crimper | [picture]

Magnetic crimp caps, 8010-0052

[picture] | TIPS & TOOLS Red rubber septa have a tendency to cause needle sticking during sampling and are more likely to core. Agilent recommends using silicone septa as a higher quality alternative to prevent contamination and issues related to septa coring.

Crimp Top Micro Vials

Agilent CrossLab offers a selection of crimp top micro vials designed for a variety of autosamplers, including HTS and HTC PAL systems, to cope with today’s high-throughput LC/MS demands. Additionally, Agilent CrossLab crimp top micro vials work seamlessly with CombiPAL and GC PAL magnetic needle guides and barcode readers.

Amber, flat bottom crimp top micro vials, 8010-0153

CrossLab Snap Top Vials and Closures

Snap top vials and caps are the simple, efficient way to a secure seal without crimping. It’s as easy as push-on, pull-off. Crimp caps can also be used with wide opening snap top vials.

Note: Snap cap vials cannot be pressurized.

2 mL (11 mm) Snap Top Vials and Closures

• 2 mL, 12 × 32 mm

• Use with any 11 mm snap or crimp cap

• Available in unique packaging designed to reduce vial breakage

• Precision-formed neck improves autosampler handling

• Optional ceramic write-on spot

2 mL (11 mm) Snap Top Glass Vials
Description | Unit | Agilent CrossLab Part No.
Clear | 100/pk | 8010-0024
Clear, write-on spot | 100/pk | 8010-0023
| 1000/cs | 8010-0177
Amber | 100/pk | 8010-0026
Amber, write-on spot | 100/pk | 8010-0025
| 1000/cs | 8010-0178

Snap top vials with write-on spot, 8010-0025

Snap caps with 11 mm red silicone septa, 8010-0103

Snap Top Solvent Vial Convenience Packs

19 mm Septa for 5 mL and 10 mL Snap Caps
Septa Type | Unit | Agilent CrossLab Part No.
Red rubber | 100/pk | 8010-0430

CrossLab Polypropylene Vials

Wide opening 12 × 32 mm vials are manufactured from virgin polypropylene, meeting the requirements of 21 CFR 177.1520. Polypropylene vials are translucent and can be used with crimp or snap caps.

CrossLab polypropylene vial, crimp/snap top, 8010-0158

Polypropylene vial with glass insert, 8010-0160

CrossLab Micro-V Vials

• Wide opening, 1.5 mL vials with low residual volume

• Made from first hydrolytic glass Type 1

• Standard 12 × 32 mm dimension

• Compatible with 11 mm crimp closures

Clear, crimp top Micro-V vial, 8010-0004

| TIPS & TOOLS
[picture] | For economical and effective microsampling, choose the polypropylene vial with molded glass flanged insert. Its polypropylene body has a glass flanged insert molded to the inside, so the sample comes in contact only with the high quality glass insert and the septum.

CrossLab Microvolume Inserts

To meet your microsampling needs, Agilent offers a variety of microvolume inserts with capacities and designs that can transform your vials from full-capacity to limited volume with one simple step.

Microvolume inserts

250 μL conical insert with polymer feet, 8010-0131

250 μL pulled-point glass insert, 8010-0132

400 μL flat bottom glass insert, 8010-0136

CrossLab Well Plates and Sealing Mats

Choose the cleanest well plates and sealing mats for your autosamplers

Advantages of Agilent CrossLab well plates:

• Made from polypropylene

• Free from RNase, DNase, Endotoxins, and human DNA

• Chemically resistant to common solvents

• Autoclavable (121 °C/20 min)

• Alpha-numeric grid

• Compatible with pipetting workstations and multi-channel pipettes

• Raised rims are available with 0.5 mL and 1.0 mL deep well plates for efficient sealing and a reduced risk of cross-contamination during rigorous vortexing

• Available in 96- or 384-well plate format

• 96-well plates range from 0.2 mL to 2 mL

• 384-well plates available in 0.1 mL and 0.25 mL

• Stackable

Advantages of Agilent CrossLab sealing mats:

• Protect well contents during storage

• Free from RNase, DNase, Endotoxins, and human DNA

• Highly flexible for a tight seal and exact fit

• Insets in every well eliminate the need for glue during connection

• Pierceable with pipette tips (0.5 mL and 1.0 mL sealing mats)

• Prevent solvent evaporation

• Made from thermoplastic elastomer (TPE) or ethylene-vinyl acetate (EVA)

• Compatible with common solvents

Cleanliness of well plates and sealing mats: Agilent CrossLab vs. the competition

CrossLab Well Plates and Sealing Mats

Agilent CrossLab offers a range of polypropylene 96-well or 384-well plates with a variety of sealing options for collection of samples, storage, and use in autosamplers.

Sealing Mats and Accessories
Description | Unit | Agilent CrossLab Part No.
Sealing mat for 0.2 mL 96-well plates, Thermoplastic Elastomers (TPE) | 5/pk | 8010-0577
Sealing mat for 0.5 mL and 1.0 mL 96-well plates, Thermoplastic Elastomers (TPE) | 50/pk | 8010-0535
Sealing mat for 2 mL 96-well plate, Ethylene Vinyl Acetate (EVA) | 50/pk | 8010-0537
Sealing tape for 384-well plate, polyethylene | 100/pk | 8010-0540
Sealing foil, self adhesive, high transparency, for all plates, Polyethylene terepthalate (PET) | 100/pk | 8010-0541
Sealing foil, self adhesive, for all plates, Polypropylene | 100/pk | 8010-0578

96-well plate, 8010-0534

96-well plate with removable sealing mat, 8010-0534

Sealing mat for 2 mL 96-well plate, (EVA), 8010-0537

CrossLab Vials Cross Reference List

The cross references to the original equipment manufacturer (OEM) part numbers listed here serve as a recommendation that the CrossLab products are viable alternatives to OEM products. CrossLab products are compatibile with the corresponding OEM instruments, although in some cases, the CrossLab products may have slightly different designs as compared to the OEM counterparts.

CrossLab Vials for Bruker/Varian |
Similar to Bruker/Varian Part No. | Agilent CrossLab Part No.
392611525 | 8010-0195
392611530 | 8010-0414
392611549 | 8010-0198
392611550 | 8010-0199
392611593 | 8010-0125
190010204 | 8010-0131
392611594 |
392620538 |
392611596 | 8010-0132
392611636 |
392611607 | 8010-0143
392611607 | 8010-0413
392611613 | 8010-0142
392611613 | 8010-0412
392611631 | 8010-0050
392611632 | 8010-0051
390886500 | 8010-0002
392611634 |
392611639 | 8010-0011
392620550 |
CP10271 |
392611640 | 8010-0013
392611641 | 8010-0056
392611641 | 8010-0061
392611645 | 8010-0064
392611641 | 8010-0066
392611645 | 8010-0059
392611645 | 8010-0069
392611646 | 8010-0015
392611653 |
392611654 | 8010-0017
392611659 | 8010-0084
392611659 | 8010-0086
392611659 | 8010-0088
392611667 | 8010-0159
392611675 | 8010-0034
392612021 |
MLA202100 |
392611857 | 8010-0151
392610003 | 8010-0116
392611858 |
ROK7382420 |
392611859 | 8010-0121
392611871 | 8010-0108
392611970 | 8010-0416
392611974 |
392611975 |
392611980 |
392611981 |
392611982 |
392620104 | 8010-0040
392620202 | 8010-0042
392620204 | 8010-0044
392620302 | 8010-0139
392620304 |
392620306 | 8010-0140
392620401 | 8010-0417
392620403 |
392620500 | 8010-0175
CPLC40111B |
CPLC40111R |
190010209 | 8010-0092
392620510 |
190010209 | 8010-0093
392620510 |
392620514 | 8010-0008
392620517 | 8010-0170
392620526 | 8010-0032
392620528 | 8010-0036
1600069800 | 8010-0070
390614901 | 8010-0072
6900016900 |
R005486RT1 |
CP10204 | 8010-0029
CP10205 | 8010-0033
CP10277 | 8010-0020
CP741315 | 8010-0038
CP913323 |
CP912446 | 8010-0418
CP913077 |
CP959464 | 8010-0420
CP959485 | 8010-0155
39260500 | 8010-0014
CPLC40111B |
CPLC40111R |
CPLCL07CPVA | 8010-0172
CPLCL11ACBST144 | 8010-0183
MLA110040M | 8010-0152
392611860 | 8010-0165
392612017 |
MLA2000051 ML |
MLA21000 | 8010-0030
R000548SCY | 8010-0160

CrossLab Vials for PerkinElmer
Similar to PerkinElmer Part No. | Agilent CrossLab Part No.
B0104239 | 8010-0143
B0104241 | 8010-0144
B4000022 | 8010-0122
B4000025 | 8010-0121
N6356478 | 8010-0030
N6356479 | 8010-0038
N9300500 | 8010-0195
N9300700 | 8010-0198
N9301385 | 8010-0002
N9302680 | 8010-0003
N9302684 | 8010-0047
N9302685 | 8010-0048
N9302686 | 8010-0046
N9303416 | 8010-0106
N9303416 | 8010-0113
N9303417 | 8010-0105
N9303417 | 8010-0112
N9303418 | 8010-0024
N9303419 | 8010-0104
N9303419 | 8010-0111
N9303441 | 8010-0055
N9303442 | 8010-0073
N9303992 | 8010-0413
N9306015 | 8010-0051
N9306052 | 8010-0054
N9306075 | 8010-0042
N9306077 | 8010-0119
N9306079 | 8010-0034
N9306201 | 8010-0015
N9306202 | 8010-0086
N9306207 | 8010-0023
N9306208 | 8010-0025
N9306220 | 8010-0017
N9306228 | 8010-0050
N9306229 | 8010-0049
N9306240 | 8010-0152
N9306247 | 8010-0020

CrossLab Vials for Shimadzu
Similar to Shimadzu Part No. | Agilent CrossLab Part No.
038-00165-06 | 8010-0011
220-90384-00 | 8010-0055
220-90393-00 | 8010-0020
220-90394-00 | 8010-0096
220-91521-14 | 8010-0095
220-94562-00 | 8010-0412
220-94563-00 | 8010-0413
220-94796-01 | 8010-0042
220-94796-02 | 8010-0119
220-94796-07 | 8010-0038
221-34271-92 | 8010-0054
221-34271-92 | 8010-0056
221-34271-92 | 8010-0072
228-21290-91 | 8010-0098
228-45450-91 | 8010-0198
228-45452-91 | 8010-0199

CrossLab Vials for Thermo Scientific
Similar to Thermo Scientific Part No. | Agilent CrossLab Part No.
60180-507 | 8010-0008
10-800-247 | 8010-0038
14-824-365 | 8010-0042
60180-502 | 8010-0001
C4011-1W |
2-CV |
11 09 0476 |
60180-504 | 8010-0030
10-800-246 |
60180-505 | 8010-0032
14-824-360 |
60180-506 | 8010-0034
60180-507 | 8010-0008
60180-508 | 8010-0010
60180-509 | 8010-0014
C4000-1W |
2SVW |
11 090519 |
60180-510 | 8010-0020
C4015-1 |
4-SV |
13 09 0222 |
60180-511 | 8010-0116
60180-513 | 8010-0117
60180-514 | 8010-0055
60180-514 | 8010-0060
60180-514 | 8010-0065
60180-514 | 8010-0070
60180-515 | 8010-0061
60180-516 | 8010-0086
60180-521 | 8010-0122
60180-522 |
60180-526 | 8010-0046
60180-560 | 8010-0012
60180-561 | 8010-0016
C4000-2W |
2SVW(A) |
11 09 0520 |
60180-562 | 8010-0066
60180-597 | 8010-0195
60180-599 | 8010-0198
60180-713 | 8010-0112
C4013-98Y | 8010-0166

CrossLab Vials for Waters
Similar to Waters Part No. | Agilent CrossLab Part No.
186000842 | 8010-0557
186001420 | 8010-0563
186001421 | 8010-0565
186001422 | 8010-0564
186000307C | 8010-0542
186000838C | 8010-0553
186000839C | 8010-0555
186000847C | 8010-0543
186001133C | 8010-0554
186001134C | 8010-0556
WAT025053C | 8010-0575
WAT025054C | 8010-0574

Agilent Syringes

With a broad selection of syringes for manual and auto injectors, Agilent has what you need for accurate and effective sampling.

Whether you need an autosampler or manual syringe, there are two keys to choosing the right syringe – identifying your sample type and establishing the smallest volume to be dispensed or injected. Agilent offers two varieties of syringes.

PTFE-Tipped Syringes for Gases and Liquids

PTFE-tipped syringes have a precision-machined plunger tip that forms a tight seal and enables the tip to wipe the barrel’s interior free of sample during operation. This feature is particularly useful for viscous or heterogeneous samples, because it reduces deposits that can cause the plunger to freeze. Replacement plunger assemblies are available for most PTFE-tipped syringes.

Fitted Plunger Syringes for Liquids

Fitted plunger syringes feature a stainless steel plunger that is meticulously hand-fitted to its matching glass barrel, creating a liquid-tight seal. These syringes are ideal for homogenous samples that are not prone to precipitation or bonding with glass. Note: plungers cannot be interchanged or replaced if damaged.

Syringe Features

Reference drawing (not to scale)

Needle Gauge

Needle gauge is the thickness of the needle. The gauge depends on the injector. When selecting a needle gauge, it is important to keep in mind the volume of the syringe and the dead volume of the needle. Refer to the chart below to choose a needle gauge with an appropriate dimension before selecting a needle.

[picture] | Tapered Dual Gauge 23-26 or 23s-26s (0.64-0.47 mm) Durability of a 23-gauge Versatility of a 26-gauge for split/splitless and on-column injection

[picture] | Single Gauge 22 (0.71 mm)

HPLC valves

Pipetting liquids

Single Gauge 23 or 23s (0.64 mm)

Merlin Microseal septa

Packed column injector ports

Split/splitless injector ports

[picture] | Single Gauge 26 or 26s (0.47 mm) Packed column injector ports Split/splitless injector ports

Note: Needles with an ‘S’ following the gauge are more durable, with a thicker needle wall and smaller id bore.

Needle Termination

Needle terminations are available in fixed or removable, with various tip styles:

• Fixed (cemented) – Economical, reproducible injections for autosamplers

• Removable needle – One syringe fixed – many methods, simplicity of fixed needle, but needle can be replaced if damaged or clogged

• Luer tip – Easy, fast needle replacement, syringe filter or pump priming, Luer tip is ground glass suitable for mounting chromatographic or PTFE needles, syringes can be autoclaved (without plunger or needle)

• Luer Lok – Security of a locked needle, syringe filter or pump priming, PTFE, male Luer taper with nickel-plated brass locking hub for use with KEL-F or metal hub needles and universal connectors

Autosampler Syringes

Premium autosampler syringes optimize system productivity and ensure precise sample handling

Agilent Blue Line Autosampler Syringes for 7693A ALS

Agilent blue line autosampler syringes are specifically designed to support the higher productivity features of the 7693A ALS, while increasing plunger life and reducing costly downtime. Backed by over 40 years of chromatography experience, these meticulously crafted syringes offer:

• Wider range of volumes including exclusive 250 and 500 μL syringes for sample enhancement with the new 7693A

• Precise match with your autosampler’s stroking mechanism, resulting in more accurate volume delivered

• Smooth needle that reduces septum coring and keeps your system working at its full potential

• Choice of PTFE-tipped or metal fitted plunger to meet application needs

• Easy-open, environmentally friendly packaging

• Certified compliance with strict Agilent specifications

Blue line autosampler syringe shown in 7693A ALS, G4513-80204

TIPS & TOOLS

Order your free GC troubleshooting and GC column installation posters at www.agilent.com/chem/Gcposteroffer | [picture]

Blue Line Autosampler Syringes with Fitted Plungers

Fitted plunger syringes are recommended for homogeneous liquid samples. Each fitted syringe is individually matched with the plunger for precision injection. Plungers are not interchangeable or replaceable.

Blue line autosampler syringe, G4513-80205

Blue line autosampler syringe, G4513-80204

Blue Line Autosampler Syringes with PTFE-Tipped Plungers

Suitable for gas and liquid samples, the PTFE tip of the plunger creates a tight seal between the plunger and glass, helping to reduce carry-over and increase syringe lifetime. Replacement plungers are available.

Needles, replacement, G4513-80236

Advanced Sample Enhancement Autosampler Syringes with PTFE-Tipped Plungers

Used with the 7693A optional Enhanced Sample Handling Syringe Carriage, these syringes can eliminate analyst-to-analyst variability and reduce re-work in sample preparation, such as dilution and internal standard addition.

Blue line autosampler syringe, G4513-60560

Gold Standard Autosampler Syringes

Use one needle and get the benefits of two. The upper portion of the tapered needle offers the strength of a 23-gauge needle, while the lower portion at 26s-gauge allows use with split/splitless or on-column injections with 0.53 mm id columns. All standard plungers are stainless steel.

Autosampler Syringes

7673/7683 On-Column Autosampler Syringes

Agilent 7673/7683 on-column syringes with needle diameter for columns ranging from 0.25 mm to 0.53 mm are specifically designed for the 7673/7683 Autosampler.

HP 7670/71/72 Autosampler Syringes

This syringe has a long needle and regular plunger button for compatibility with HP 7670/71/72 autosamplers. Available with a fixed or removable needle.

Autosampler syringe, 10 μL, straight, RN, 5182-9626

Manual Syringes

Agilent color-coded manual syringes allow you to determine syringe volume with one quick glance, so you can more efficiently perform manual dilution, extraction, and sample prep. They also give you the advantages of:

• Improved scale readability with a new vertical syringe scale orientation for more intuitive use

• A wide selection of volumes, making Agilent your “one-stop” resource for all of your sample manipulation needs

• Accuracy within ±1% of nominal volume, and precision within 1%, measured at 80% of total scale volume

• Earth-friendly cardboard and plastic packaging that could be recycled to help reduce landfill waste

• A Certificate of Conformance to ensure the highest quality construction and performance, available for viewing and printing anytime

• Lot-traceable for accurate identification

Of course, all Agilent syringes are backed by over 40 years of chromatography expertise, industry-leading technical support, and a 90-day warranty from the date of shipment.

Manual syringe, 1.0 μL, RN cone tip, 5190-1463

Manual syringe, 50 μL, FN bevel tip, 5190-1500

Manual syringe, 500 μL, FN bevel tip, 5190-1523

Manual syringe, 1 mL, FN bevel tip, 5180-1528

Luer Lok valve, 5190-1531

Luer Lok, 5190-1534

Luer Lok valve, 5190-1543

Syringe, 100 μL FN LC tip, 5190-1508

Agilent CrossLab Syringes

CrossLab GC Autosampler Syringes

With a broad selection of syringes for auto injection, CrossLab autosampler syringes provide what you need for accurate and effective sampling. CrossLab syringes meet all fit, form, and function criteria for specific autosampler models. Agilent delivers more value in every autosampler syringe:

• Lot number printed directly on the barrel with a corresponding Certificate of Conformance

• Illuminating backing strip, for effortless viewing of the volume scale

• Environmentally friendly packaging and improved design that reduces waste

• Individually packaged for contaminant-free use right out of the box

Autosampler syringe, 10 μL fixed needle, 8010-0351

Autosampler syringe, 5 μL, fixed needle, 8003-0001

Autosampler syringe, 5 μL, gas tight, fixed needle, 8003-0002

TIPS & TOOLS |
Replace syringe if dirt is noticeable, syringe cannot be cleaned or plunger doesn’t slide easily. Replace needle if septa wear is abnormal or needle is clogged. | [picture]

Needle Gauge

[picture] | Single Gauge 23 (0.64 mm) Packed column injector ports Split/splitless injector ports

[picture] | Single Gauge 26 (0.47 mm) Packed column injector ports Split/splitless injector ports

Needle Termination

Needle terminations are available in fixed or removable, with various tip styles.

Fixed (cemented)

• Economical, reproducible injections for autosamplers

• Preferred for applications requiring trace level samples

• Recommended for use where probability of needle bending is minimal

• Can be heated up to 70 °C

Removable needle

• Versatile option for injections

• Needle can be replaced if damaged or clogged

• Allows needle to be changed for different applications

• Can be heated up to 120 °C

| TIPS & TOOLS
[picture] | Follow manufacturer’s recommendation for syringe cleaning and regularly inspect syringe barrel for sample build-up and needle tip for wear.

The cross references to the original equipment manufacturer (OEM) part numbers listed here serve as a recommendation that the Agilent CrossLab products are viable alternatives to OEM products. CrossLab products are compatible with the corresponding OEM instruments, although in some cases, the CrossLab products may have slightly different designs as compared to the OEM counterparts.

The cross references to the original equipment manufacturer (OEM) part numbers listed here serve as a recommendation that the Agilent CrossLab products are viable alternatives to OEM products. CrossLab products are compatible with the corresponding OEM instruments, although in some cases, the CrossLab products may have slightly different designs as compared to the OEM counterparts.

The cross references to the original equipment manufacturer (OEM) part numbers listed here serve as a recommendation that the Agilent CrossLab products are viable alternatives to OEM products. CrossLab products are compatible with the corresponding OEM instruments, although in some cases, the CrossLab products may have slightly different designs as compared to the OEM counterparts.

The cross references to the original equipment manufacturer (OEM) part numbers listed here serve as a recommendation that the Agilent CrossLab products are viable alternatives to OEM products. CrossLab products are compatible with the corresponding OEM instruments, although in some cases, the CrossLab products may have slightly different designs as compared to the OEM counterparts.

Needle and plunger repair kit, 8010-0367

Replacement plunger, 8010-0368

CrossLab Supplies for CTC Analytics GC Autosamplers

Agilent’s CrossLab portfolio includes a variety of syringes compatible with CTC Analytics GC PAL and CombiPAL systems.

• Syringe capacities from 0.5 μL to 2.5 mL

• Fixed and removable needles

• Several needle tip styles to suit your application requirements

• High temperature syringes for headspace application with temperatures up to 150 °C

• PTFE plunger seal option for smooth, leak-free operation

• Syringe specifications are matched to CTC holders to ensure proper fit and reliable functioning

The cross references to the original equipment manufacturer (OEM) part numbers listed here serve as a recommendation that the Agilent CrossLab products are viable alternatives to OEM products. CrossLab products are compatible with the corresponding OEM instruments, although in some cases, the CrossLab products may have slightly different designs as compared to the OEM counterparts.

Autosampler syringe, 10 μL fixed needle, 8010-0351

The cross references to the original equipment manufacturer (OEM) part numbers listed here serve as a recommendation that the Agilent CrossLab products are viable alternatives to OEM products. CrossLab products are compatible with the corresponding OEM instruments, although in some cases, the CrossLab products may have slightly different designs as compared to the OEM counterparts.

Chem (1/4-28 UNF screw threads), gas tight, 8002-0405

Removable needle, gas tight, 8002-0401

The cross references to the original equipment manufacturer (OEM) part numbers listed here serve as a recommendation that the Agilent CrossLab products are viable alternatives to OEM products. CrossLab products are compatible with the corresponding OEM instruments, although in some cases, the CrossLab products may have slightly different designs as compared to the OEM counterparts.

Autosampler syringe, Luer Lock, 8005-0414

Autosampler syringe, gas tight, 8005-0417

CTC Autosampler Supplies

To better serve Agilent instrument users who choose CTC Analytics autosamplers for high-throughput and flexible sample introduction, Agilent has partnered with CTC to provide a fully integrated system, including CTC approved consumables.

Agilent’s portfolio includes a variety of vials, caps, syringes, and well plates compatible with the CTC Analytics HTC PAL, GC PAL, and CombiPAL systems.

CombiPAL and GC PAL Liquid Injection Syringes

A key feature of CTC’s GC PAL and CombiPAL is the ability to inject a wide range of sample volumes, up to 500 μL for LVI applications. The following fixed needle syringes are recommended by CTC to sustain high reproducibility and accuracy.

CTC syringes

Fixed needle, G6500-80120

| TIPS & TOOLS
[picture] | For vials and caps that work seamlessly with your CTC Analytics PAL Autosamplers, see our complete Vials and Closures section, view here.

CombiPAL Headspace Supplies

Our fixed needle headspace syringes feature a sideport needle for gas flushing, in conformance with strict CTC standards. Use with Agilent’s Merlin Microseal to minimize instrument downtime and to prevent lost or compromised data caused by septum leaks and liner contamination.

Headspace Vials

Fixed needle, G6500-80109

CombiPAL Headspace Supplies
Description | Part No.
Liner, inlet for SPME, deactivated | 5188-6471
Liner, Ultra Inert for SPME, straight | 5190-4048

HTS and HTC PAL Liquid Injection Crimp Top Micro Vials and Caps

HTS and HTC PAL high-throughput LC injection systems are configured to cope with today’s high-throughput LC/MS demands. Agilent offers a selection of crimp top micro vials designed specifically for HTS and HTC PAL systems.

HTS and HTC PAL Liquid Injection Crimp Top Micro Vials and Caps
Description | Unit | Part No.
0.8 mL, amber glass, flat bottom | 1000/pk | 5183-4487
0.1 mL, clear glass, tapered bottom | 500/pk | 5180-0844
0.3 mL, clear glass, round bottom | 500/pk | 5180-0841
0.7 mL, amber glass, round bottom | 500/pk | 5180-0805
0.5 mL, amber glass, conical bottom | 500/pk | 5180-0806
Micro Caps |  |
Crimp caps with PTFE/silicone septa | 500/pk | 5180-0842

HTS and HTC PAL Liquid Injection Syringes

Designed specifically for CTC autosamplers, these X-type syringes feature zero carryover and a long-lasting plunger for applications that demand precision and productivity. They are strongly recommended for high-throughput applications.

Agilent offers a wide selection of fixed needle, 22-gauge, pointstyle 3 syringes to accommodate a variety of applications.

X-type fixed needle, G4200-80118

Replacement plunger, G4200-80111

HTS and HTC PAL Liquid Injection Valve Supplies

Whether your HTS or HTC PAL autosampler uses the Agilent proprietary Rheodyne high-pressure 600 bar injection valve or Valco Cheminert injection valves, Agilent can help you find a sample loop to meet your most challenging applications – including:

• Rheodyne 600 bar injection valve loops, which include high-pressure Swagelok fittings

• Cheminert metal loops, which feature two 1/16 in stainless steel nuts and two stainless steel ferrules

• Cheminert PEEK loops, which include two PEEK nuts and two PEEK ferrules

HTS and HTC PAL Liquid Injection Valve Loops and Needle Seals
Description | Part No.
Rheodyne 600 bar Valve Supplies |
Stainless Steel Loops: Supplied with Swagelok fittings required for high pressure |
5 μL | 5188-6486
10 μL | 5188-6487
20 μL | 5188-6488
50 μL | 5188-6489
100 μL | 5188-6490
Stator, Rheodyne 600 bar | 5188-6491
RheBuild Kit, 600 bar, includes Rotor Seal and 3/32 in hex wrench | 5188-6492
Needle Seals, Rheodyne valve, 600 bar, 10/pk | 5188-6478
Cheminert Valve Supplies |
PEEK Loops: Include two PEEK nuts and two PEEK ferrules |
2 μL | 5188-6469
5 μL | 5188-6470
10 μL | 5188-6467
20 μL | 5188-6468
Metal Loops: Include two 1/16 in stainless steel nuts and two stainless steel ferrules |
2 μL | 5188-6457
10 μL | 5188-6458
50 μL | 5188-6460
100 μL | 5188-6461
250 μL | 5188-6462
500 μL | 5188-6463
1000uL | 5188-6464
2000 μL | 5188-6465
5000 μL | 5188-6466
PEEK Needle Seal, Valco, 22-gauge, 10/pk | 5188-6476
PTFE Needle Seal, Valco, 22-gauge, 10/pk | 5188-6477

Stainless steel loop, 5188-6486

2 μL PEEK loop, 5188-6469

10 μL PEEK loop, 5188-6467

CTC Autosampler General Supplies

For your convenience, Agilent offers a selection of replacement sampling trays, well plates and sampling accessories for CTC autosamplers.

Description | Part No.
Sample tray, 200 vials, 0.7 or 1 mL | G6500-80100
Sample tray, 98 2 mL or 78 1 mL vials | G6500-80101
Sample tray, 32 10 or 20 mL vials | G6500-80121
Sample tray, 54 2 mL vials, for PAL deep-well stack | G6500-80122
96-well plates, 0.5 mL, polypropylene, 10/pk | 5042-1386
96-deep well plates, 1 mL, polypropylene, 50/pk | 5042-6454
384-well plates, 90 μL, polypropylene, 30/pk | 5042-1388
Closing mats for 96-well plates, silicone, pre-slit, fits 96-well plates P/N 5042-1385 and 5042-1386 only, 50/pk | 5042-1389
Well plate foil cutter, max 22-gauge needle | 5188-6479

Sample tray, G6500-80101

Collection plate, showing 96-position closing mat, 5042-1389

Well plate foil cutter, 5188-6479

Gas Management

Gas Purification

Impure gases can cause installation delays, premature instrument failure, and flawed results. Purification is one of the most important steps you can take to optimize your system performance.

Agilent brings the highest performance of gas purifiers to gas chromatographers. We manufacture purifiers in a variety of sizes and configurations to remove oxygen, moisture, and hydrocarbons. We recommend that each gas chromatograph use a gas purification system with removable cartridges such as Gas Clean or Renewable. These systems ensure the highest quality gas and contain indicators to allow for timely replacement before other consumables, like columns and liners, are damaged and sensitivity decreases. Agilent Gas Purifiers are a cost effective safety and preventive measure to assure the supply of the highest purity gas to your GC and GC/MS instrumentation with considerable savings in laboratory gas costs. We also carry a line of in-line purifiers to provide high capacity or economy solutions for customers. Please refer to the Gas Purifier Selection Guide to determine which gas purifiers you should use, see here.

Carrier Gas Purification

The Carrier Gas Purification illustration on the next page shows the most common gas purification configurations used in gas chromatography.

Regardless of which purification system is employed, proper installation and maintenance are required to achieve optimal performance. A purifier that is not maintained will eventually expire and become ineffective, or worse, a source of contamination.

Gas Clean Filters

Helpful Hints for Purification Success

• Keep number of fittings in gas line to a minimum

• Install purifiers in a convenient location close to the GC

• Use purifier log books to determine maintenance and cartridge replacement schedules

• Use indicating traps closest to the GC so you can determine when to change the traps that are upstream

TIPS & TOOLS |
View the latest Agilent J&W GC column focused applications, products and educational resources at www.agilent.com/chem/mygccolumns | [picture]

Connection Diagrams for Common Detectors

Detector | Connection Diagrams
ECD Electron Capture Detector | [picture]
FID Flame Ionization Detector (Carrier Gas = Make-Up Gas) | [picture]
FID Flame Ionization Detector (Carrier Gas differs from Make-Up Gas) | [picture]

FPD

Flame Photometric Detector

PFPD

Pulsed Flame Photometric Detector

MS (ITD, MSD) Ion Trap Detector, Mass Selective Detector Two Possibilities (see diagrams to the right) | [picture]

NPD, PND

Nitrogen-Phosphorus Detector

TID, TSD

Thermionic Detector

(Carrier Gas = Make-Up Gas)

TCD Thermal Conductivity Detector | [picture]

Connection Diagrams Analyzers and Generators

Detector | Connection Diagrams
ICP-OES/ICP-MS Inductively Coupled Plasma-Optical Emission Spectrometry/Mass Spectrometry (Plasma Gas = Nebulizer Gas) | [picture]
ICP-OES Inductively Coupled Plasma-Optical Emission (Different Optic Flush Gas) | [picture]
Total Organic Carbon (TOC) Analyzer | [picture]
Zero-Air Generator | [picture]

Key:

GC/MS Filter: A triple filter that removes oxygen, moisture, and hydrocarbons

Oxygen Filter: A filter that removes oxygen

Moisture Filter: A filter that removes water

Charcoal Filter: A filter that removes hydrocarbons

CO₂ Filter: A filter that removes carbon dioxide

Gas Purification Systems

Agilent Gas Clean Filters

• Deliver clean gases for accurate analyses

• Fast, leak-free filter replacement reduces downtime

• Economical, with immediate payback

• Highly sensitive filter indicators provide maximum instrument protection

The Agilent Gas Clean Filter System delivers clean gases, reducing the risks of column damage, sensitivity loss, and instrument downtime. Inserting a Gas Clean Filter System in the gas line immediately before the instrument inlet greatly reduces the level of impurities, thus improving trace analysis. Contaminants entering your GC column will also be reduced, which is critical for high temperature analysis and essential for longer column lifetime.

Replacing the filters when they have reached absorption capacity ensures maximum protection of your GC columns and analytical hardware. The sensitive indicators change color, alerting you that the filter needs to be replaced.

A Gas Clean Filter System allows you to use 99.996% (4.6) pure helium instead of the more expensive 99.999% (5.0) or 99.9999% (6.0) grade, while still yielding high quality analytical results. The expected cost savings are 30%.

The unique connection design allows fast, leak-free replacement of the Gas Clean Filter

[picture] | TIPS & TOOLS Learn best practices for GC troubleshooting with the Agilent GC Troubleshooting video series – view at www.agilent.com/chem/Gctroubleshooting

Benefits of Using Gas Clean Filters
Technique | Filters | Benefit
GC/MS | GC/MS filter | Higher data accuracy and less maintenance
GC column | Moisture filter and oxygen filter or a GC/MS filter | Longer lifetime
ECD detector | GC/MS Filter | Greater sensitivity
TCD detector | Moisture filter and oxygen filter or a GC/MS filter | Greater sensitivity and less maintenance
Process GC | Process moisture filter | Long term stability
FID detector | Two charcoal filters (for air and hydrogen) | Greater sensitivity
PID detector | Oxygen filter and charcoal filter | Greater sensitivity
PFPD or FDP detector | Charcoal filter, CO₂ filter and moisture filter | Greater sensitivity
TSD or NPD detector | Charcoal filter, CO₂ filter and moisture filter | Greater sensitivity
Total organic carbon | CO₂ filter and moisture filter | Greater sensitivity
Zero-air generator | CO₂ filter and moisture filter | Cleaner gas
ICP-OES, ICP-MS | High flow connection unit with two oxygen filters | Greater sensitivity

Gas Clean Filters

1-position connecting unit, 1/8 in, CP7988

4-position connecting unit, 1/8 in, CP736520

High flow connecting unit 1/8 in, CP17985

Agilent Gas Clean Filter Starter Kits
Description | Part No.
Agilent Gas Clean FID Filter kit | CP7995*
Includes a 4-position 1/8 in connecting unit and two Charcoal filters, one Oxygen filter, and one Moisture filter |
Agilent Gas Clean Filter Kit, 1/8 in | CP736530
Includes a 4-position 1/8 in connecting unit and two Charcoal filters, one Oxygen filter, and one Moisture filter |
Agilent Gas Clean GC/MS Filter kit | CP17976
Includes a 1-position connecting unit 1/8 in and two GC/MS filters |
Agilent Gas Clean GC/MS Filter kit | CP17977
Includes a 1-position connecting unit 1/4 in and two GC/MS filters |
Agilent Gas Clean GC/MS Filter Installation kit | CP17978
Includes 1 m copper tubing (P/N CP17976), two nuts and two ferrules, 1/8 in |
Agilent Gas Clean CO₂ kit | CP17982
Includes 2-position 1/4 in connecting unit and CO₂ and moisture filters |
Agilent Gas Clean CO₂ kit | CP17983
Includes 2-position 1/8 in connecting unit and CO₂ and moisture filters |
Agilent TCD Filter Kit | CP738408
Includes a 2-position 1/8 in connecting unit, one Oxygen filter, and one Moisture filter |
Agilent GC Installation Kit | 19199N
Includes CP736530 and many useful fittings and accessories. |

*For 1/8 in tube, use reducer 1/8 in × 1/4 in, P/N CP4392

Connecting Units
Description | Part No.
1-position connecting unit, 1/4 in | CP7980
1-position connecting unit, 1/8 in | CP7988
2-position connecting unit, 1/4 in | CP738406
2-position connecting unit, 1/8 in | CP738407
4-position connecting unit, 1/4 in | CP7989
4-position connecting unit, 1/8 in | CP736520
High flow connecting unit, 2-position, 1/4 in | CP17984
High flow connecting unit, 2-position, 1/8 in | CP17985
1-position, stainless steel, 1/4 in tube | CP7980P4
1-position, stainless steel, 1/8 in tube | CP7988P8
1-position, stainless steel, 3 mm tube | CP7988P3
1-position, stainless steel, 6 mm tube | CP7980P6

Replacement Gas Clean Filters
Description | Part No.
Agilent Gas Clean CO₂ filter | CP17969
Agilent Gas Clean Oxygen filter | CP17970
Agilent Gas Clean Moisture filter | CP17971
Agilent Gas Clean Process Moisture filter | CP17971P
Agilent Gas Clean Charcoal filter | CP17972
Agilent Gas Clean GC/MS filter* | CP17973

*GC/MS filter removes Hydrocarbons, Moisture, and Oxygen, and can be used to purify any GC carrier gas. It is the best filter for protecting your inert consumables.

Accessories and Fittings
Description | Part No.
Wall mounting bracket for connecting unit For CP7980 and CP7988 | CP7981
Upper part filter connecting unit | CP7978
Flush head for connecting unit | CP7987
Male connector, 1/4 in with dust filter | CP7986
Male connector, 1/8 in with dust filter | CP82117
Viton O-rings, two sets | CP7983
Male connector, stainless steel, 1/4 in with dust filter | CP7986SS
Male connector, stainless steel, 1/8 in with dust filter | CP82117SS
Male connector, stainless steel, 3 mm with dust filter | CP82117SS3
Male connector, stainless steel, 6 mm with dust filter | CP7986SS6

Agilent Gas Clean GC/MS filter, CP17973

Wall mounting bracket for connecting unit, for CP7980 and CP7988, CP7981

Flush head for connecting unit, CP7987

TIPS & TOOLS |
GC/MS filter removes Hydrocarbons, Moisture, and Oxygen and can be used to purify any GC carrier gas. It is the best filter for protecting your inert consumables. | [picture]

Renewable Gas Purification System

The Renewable Gas Purification System from Agilent not only traps large quantities of contaminants and lasts a long time, but it is also recyclable. With average use, you’ll only need to purchase a replacement cartridge once per year or after approximately 20 cylinders’ worth of purification. When you need a replacement, you have the option to purchase a new or recycled cartridge. Recycled cartridges are refilled and certified to the full specifications of the new cartridges.

• Agilent’s highest capacity and most economical purification system

• All cartridges are environmentally friendly and reduce waste

• High capacity – 850 cc or more oxygen filtration, 12 g H₂O, and approximately 8 g hydrocarbon filtration per cartridge – in a compact footprint

• Improves 99.995% gas purity to 99.9995% purity

• Dual indicators make it easy to see the purification results

• Labeling displays indicator color and shape for accurate reading

• Simple twist on/off knob and guide rod make cartridge changes quick and easy

• One renewable gas purifier system can support up to four GC systems

• Designed with efficiency, safety, and environmental responsibility in mind

• All replacement cartridges include return packaging and instructions

Renewable Gas Purification System
Description | Part No.
Renewable gas purifier system startup kit | G3440-60004
Includes one G3440-80007 base, one G3440-60003 renewable gas purifier cartridge, wall or bench mount hardware, and instruction manual |
Renewable gas purifier cartridge, new | G3440-60003
Renewable gas purifier cartridge, recycled | G3440-69003
Renewable gas purifier system, base only | G3440-80007
Return packaging set | 5190-1414
For return of G3440-60003 or G3440-69003 renewable gas purification cartridge when original packaging is lost or damaged | 5190-1414

Renewable gas purification system (left) and recycled cartridge (right)

Renewable gas purifier cartridge, new, G3440-60003

| TIPS & TOOLS
[picture] | For more information about the Renewable Gas Purification System, visit www.agilent.com/chem/renewable

In-Line Gas Traps

The purpose of gas traps is to remove detrimental impurities from carrier and detector gases. Combination traps are available which remove moisture, oxygen, and/or organics with a single trap. The effectiveness of the traps depends on the initial quality of the gas.

Constant exposure of capillary columns to oxygen and moisture, especially at high temperatures, results in rapid and severe column damage. The use of oxygen and moisture traps for the carrier gas may extend column life and protect the instrument. Any moisture or oxygen introduced into the gas stream due to a leak will be removed by the trap until it expires.

Big universal Traps

Big Universal Traps utilize a layered, multi-adsorbent bed packing of the most effective, highest capacity adsorbent materials available today for the removal of oxygen, moisture, hydrocarbons, carbon dioxide, and carbon monoxide from helium gas streams. The volume of the various adsorbent materials in the Big Universal Trap was developed through rigorous testing and evaluation in order to ensure that breakthrough of the five major contaminant groups occurs as simultaneously as possible as each material achieves complete saturation.

One Big Universal Trap unit will easily purify the contents of thirteen “K” size cylinders of 99.997% purity helium to a cumulative level of 100 μg/L of O₂ H₂O, CO₂, CO, and hydrocarbons at a flow rate of up to 8 L/min. All tube fittings are Swagelok stainless steel, fitted with 40 μm stainless steel frits for particulate control. Maximum pressure is 250 psi.

Big Universal Traps are more economical than other purifiers, offering nearly three times the capacity.

Big Universal Traps are ideal for any GC or GC/MS application where helium is employed and assurance of purity is essential. Combining the contents of three individual in-line traps into a single unit reduces the number of potential leaks and the possibility of aspirating contaminants into the gas stream. A single purifier also simplifies installation and replacement.

Big universal trap

TIPS & TOOLS |
Big universal traps have nearly three times the capacity of other purifiers. | [picture]

Capacity Data
High Purity Helium-99.997% |  | Removal Capacity
O₂ | < 5 mg/L | 1.07 L
THC* | < 1 mg/L | 20 g
H₂O | < 5 mg/L | 46 g

*Total Hydrocarbons, analysis limited to three contaminant groups

Big Universal Traps (RMS Series)
Description | 1/8 in Part No. | 1/4 in Part No.
Hydrogen | RMSHY-2 | RMSHY-4
Helium (Ar/Me) | RMSH-2 | RMSH-4
Nitrogen | RMSN-2 | RMSN-4
Trap Mounting Clips
Big Mounting Clip, 2/pk | UMC-5-2 | UMC-5-2

Big Traps

• Pressure: Up to 250 psig

• 750 cm³ gas purifiers

• Ideal for bulk purification applications or where several instruments are plumbed from a single gas source

• One piece of heavy-walled aluminum tube eliminates potential leaks

• Equipped with sintered stainless steel frits to prevent particulate contamination

Big moisture trap

Indicating Moisture Traps

This is an advanced-design gas filter for applications requiring high-efficiency moisture removal with the benefit of a depletion indicator. The adsorbing materials are Molecular Sieve 5Å and cobalt-free indicator, held in a sturdy glass tube. The gas to be purified contacts only glass, metal and the absorbent.

The indicator changes color from greenish-yellow to blue at about 5% relative humidity to signal leaks in the system; the molecular sieve removes moisture to trace levels. The glass tube is sealed with a special dual sealing system for extra protection from leaks. An internal frit at each end prevents particulate contamination. The inner glass tube in the Moisture Trap is enclosed in a plastic outer tube for safety. Dimensions: 3.5 cm × 26 cm, maximum pressure 6.8 bar (100 psig).

Dual Seal Design: In this design the glass inner tube is protected by a sealed outer plastic tube. Even if the glass tube fails, the gas system is fully protected against leaks.

Description | 1/8 in Part No. | 1/4 in Part No.
Glass Indicating Moisture Trap | 5182-9211 | 5182-9411

Glass Indicating Moisture Trap

Indicating Oxygen Traps

This is an improved, compact indicating filter for high-efficiency oxygen removal, suitable for use with chromatography carrier gas streams. It removes oxygen to low-ppb levels, with an indicator that changes color from green to gray when adsorption capacity is depleted. The adsorbent forms copper oxide in the presence of oxygen; no gas is generated.

The Glass Indicating Oxygen Trap is recommended as a downstream indicator for high-capacity traps. It can be used with non-oxidizing gases such as He, Ar, N₂, H₂ or CH₄, with maximum recommended flow rate of 150 cc/min. The absorbents are held in a heavy-walled inner glass tube, shielded by an outer clear plastic tube for increased safety. Maximum pressure is 6.8 bar (100 psig). Approximate dimensions are 3.5 cm × 26 cm including fittings.

Dual Seal Design: In this design the glass inner tube is protected by a sealed outer plastic tube. Even if the glass tube fails, the gas system is fully protected against leaks.

Description | 1/8 Part No. | 1/4 Part No.
Glass Indicating Oxygen Trap | 5182-9201 | 5182-9401
Glass Indicating Oxygen Trap, Stainless Steel Fitting | 5182-9202 | 5182-9402

Glass Indicating Oxygen Trap

Oxygen Traps

• Reduces oxygen to less than 1 μg/L

• Environmentally safe

This trap removes the oxygen rather than converting it to another form of contamination.

Economy non-indicating oxygen trap

Hydrocarbon Traps

Hydrocarbon trap, HT200-2

Combination Traps

Oxygen/Moisture Traps

Oxygen/moisture adsorbents team up to give you two functionalities in the same trap. Unlike some oxygen/moisture traps, these traps are disposable.

Consider the safety, performance, and cost advantages of Agilent capillary-grade oxygen/moisture traps (OT3) compared to heated, catalytic traps.

• Optimized for maximum surface area and capacity

• Leak-free, one-piece design (tested to 2000 psi)

• Bed material treated with ultra-high purity helium

• Filter design: prevents channeling, promotes efficient scrubbing

In addition to inert gases (nitrogen, helium, argon, and krypton), the Agilent OT3 Trap treats streams of hydrogen, alkanes, alkenes, aliphatic hydrocarbon gases, low boiling aromatics, carbon dioxide, carbon monoxide, and argon-methane.

Agilent OT3 trap

| HOW DOES IT WORK?
[picture] | The Agilent OT3 Trap contains a highly active, metal-containing, scrubbing material in an inert, aluminum body.

Hydrocarbon/Moisture Traps

• Replace most mixed bed traps supplied by GC manufacturers

• Mounting panel

Hydrocarbon/Moisture trap

Combination Traps for Chemical Ionization MS
Description | Fitting (in) | Part No.
Chemical Ionization for MS* | 1/8 | G1999-80410

*Isobutane or methane applications only

Universal/External Split Vent Trap

• Protects lab from contaminants released by split injection systems

• Stops environmental pollution by trapping and eliminating a broad range of contaminants

• Easy to change

• Comes with three packs of replacement cartridges

Split vent trap and cartridges, RDT-1020

Universal/External Split Vent Trap
Description | Part No.
Universal/external split vent trap with 3 cartridges, 1/8 in Swagelok fitting | RDT-1020
Replacement cartridges, 3/pk | RDT-1023

TIPS & TOOLS |
Remember to replace split vent cartridge every six months. | [picture]

ADM Flow Meters

ADM flow meters allow most gas measurements with the touch of only one button – turn it on, and the instrument provides continuous, hands-free flow readings. Measure column, detector, and carrier gas flows without making any adjustments. ADM flow meters are ideal for measuring gas streams with a changing gas composition. For example, if gas flow is measured from a digestion system, concentration changes in methane, carbon dioxide, and oxygen will not affect accuracy.

All ADM flow meters are battery powered and field-portable. Agilent calibrates each instrument to 5-point, NIST-traceable standards to ensure the highest available accuracy. The ADM family measures flow volumetrically, so you don’t have to make adjustments when changing from one gas to another.

ADM 1000

• Accuracy ± 3%

• Operating temperature range – 0 to 45 °C for the instrument, -70 to 135 °C for the tubing

• Calibration – traceable to NIST primary standards

• Real-time, split ratio measurement

• CE mark certified

• Measures flow rates from 0.5 to 1000 mL/min

• Split ratios – compare the ratio from one gas measurement to another (i.e., injection port split ratios)

ADM 1000

ADM 2000

In addition to the features of the ADM 1000, the ADM 2000 includes:

• Mass flow measurements – measure flow rate, independent of atmospheric pressure and temperature (calculated)

• Data output through RS-232 port

• 9 V battery and AC power adapter (120 or 220 VAC)

ADM 2000

Flow Meters

Precision Gas Flow Meter

Agilent’s Precision Gas Flow Meter is the ultimate gas flow meter for chromatography applications. This handheld flow meter is highly accurate, reliable and incorporates industry leading performance. The inherent stability of the rugged, solid state components allows Agilent to provide the longest calibration interval on the market, all traceable to NIST standards.

• Highly accurate and reliable measurement of common carrier and fuel gases used in GC, including nitrogen, air, carbon dioxide, hydrogen, helium, and argon/methane

• Two year guaranteed calibration period traceable to NIST standards

• Measures flow based on gas viscosity properties with an accuracy of ± 0.8% of reading + 0.2% of full scale

• Flow rate range from 5 to 500 mL/min

• Displays mass flow, volumetric flow, temperature, and pressure readings simultaneously

• Can be plumbed inline

Precision gas flow meter, 5067-0223

Precision Gas Flow Meter
Description | Part No.
Precision gas flow meter | 5067-0223

TIPS & TOOLS

Ensure you are maximizing the inertness of your GC flow path with the Agilent Ultra Inert Poster – www.agilent.com/chem/UIorder | [picture]

Gas Leak Detector

Gas leak detector, G3388B

Gas leaks can cause detector noise and baseline instability, shorten column life and waste expensive carrier gas. Liquid leak detectors, although inexpensive, can contaminate your system. Agilent’s G3388B Electronic Gas Leak Detector is an easy way to quickly identify leaks in your system and prevent system downtime.

• Detects thermal conductivity differences

• Audible and visual alerts

• Minimum detection limit – 0.0005 mL/min hydrogen and helium

• Lightweight – only 105 g

• Small – roughly 50 (w) × 19.5 (d) × 111 (h) mm

• Rechargeable Lithium Ion Battery with over 5 hours of life

• Includes a USB cable for battery charging

• One year warranty from Agilent

Gas Leak Detector |
Description | Part No.
Handheld electronic gas leak detector | G3388B

G3388A Replacement Parts |
Description | Part No.
Replacement filter tip | 5067-0218
Replacement battery | 5067-0219
Replacement power supply | 5067-0220

[picture] | TIPS & TOOLS For more information about the Gas Leak Detector, visit www.agilent.com/chem/leakdetector

Gas Cylinder Regulators, U.S. Only

To plumb your system properly, select one of Agilent’s economical brass regulators and the proper gas purification devices from our newly expanded product offering. These regulators and our broad spectrum of in-line filters, combination traps, and gas purification systems are an excellent combination to plumb your systems. Our new gas purification selection guide and diagrams will help you determine which products can be used with the regulators below.

Brass body regulator

Brass Body, Dual Stainless Steel Diaphragms

Specifications
Max inlet pressure | 3000 psig
Operating temperature range | -40 °F to 165 °F
Inlet-outlet port | 1/4 in, MNPT

Outlet valve

1/4 in, MNPT

2 1/2 in dual-scale gauges

CGA-346, 350, 340, 580, 590

Internal self-reseating relief valve

Delivery pressures | 1 to 125 psig
Weight | 5.6 lb

Brass Body, Two-Stage Stainless Steel Diaphragms, 1/8 in, U.S. Only* |
Description | Part No.
CGA 346, 125 psig max (8.6 bar), Breathing Air | 5183-4641
CGA 350, 125 psig max (8.6 bar), H₂, Ar/Me | 5183-4642
CGA 540, 125 psig max (8.6 bar), O₂ | 5183-4643
CGA 580 Regulator, 125 psig max (8.6 bar), He, Ar, N₂ | 5183-4644
CGA 590, 125 psig max (8.6 bar), Industrial Air | 5183-4645

*For 1/4 in tubing, purchase a 1/4 in adapter, U.S. only

Connector (Swagelok-style to female NPT), 0100-0118

Connectors (Swagelok to Female NPT)
Description | Unit | Part No.
1/8 in (A) × 1/4 in (B) connector, brass (included with brass regulators) | 1/ea | 0100-0118
1/4 in (A) × 1/4 in (B) connector, brass* | 1/ea | 0100-0119
PTFE tape, industrial roll |  | 0460-1266

*Required for plumbing 1/4 in tubing to regulators

Connector (Swagelok-style to female NPT), 0100-0119

Cylinder Wall Bracket |
Description | Part No.
Cylinder wall bracket with strap & chain (cylinder size up to 14 in, 35 cm) | 5183-1941

Cylinder wall bracket, 5183-1941

Kits, Fittings, Tools and Accessories

GC Installation Kits

Gas Clean Filters

Agilent Installation Kits for GC are designed to provide you with the essential items necessary for a successful installation while providing a substantial cost saving over individual purchases.

GC Installation Kit with Gas Purifiers
Description | Unit | Part No.
GC Installation Kit with Gas Purifiers |  | 19199N
Gas Clean Filter Kit, 1/8 in |  | CP736530
Snoop, 8 oz (236 mL) bottle |  | 9300-0311
1/8 in brass nut and ferrule set | 20/pk | 5080-8750
Copper tubing, 1/8 in, 50 ft |  | 5180-4196
1/8 in tee, brass | 2/pk | 5180-4160
1/8 in cap, brass | 6/pk | 5180-4121
Universal/external split vent trap with 3 cartridges |  | RDT-1020
Tubing Cutter |  | 8710-1709

Low dead volume tee, 5180-4160

1/8 in brass cap, 5180-4121

GC Installation Kit with Tools (no gas purifiers), 19199M

GC Installation Kit with Tools (no gas purifiers)
Description | Unit | Part No.
GC Installation Kit with Tools (no gas purifiers) |  | 19199M
Snoop, 8 oz (236 mL) bottle |  | 9300-0311
1/8 in brass nut and ferrule set | 20/pk | 5080-8750
Copper tubing, 1/8 in, 50 ft, precleaned |  | 5180-4196
1/8 in tee, brass | 2/pk | 5180-4160
Tubing cutter, 1/8 to 5/8 in od tubing |  | 8710-1709
1/8 in cap, brass | 6/pk | 5180-4121
Nut driver, 7 mm |  | 8710-1217
Screwdriver, Torx T10 |  | 5182-3466
Screwdriver, Torx T20 |  | 5182-3465
Open end wrench, 1/4 and 5/16 in |  | 8710-0510
Open end wrench, 7/16 and 9/16 in |  | 8710-0803
Open end wrench, 7/16 and 3/8 in |  | 8710-0972
Wrench, 1/2 and 7/16 in |  | 8710-0806

GC Basic Installation Kit |
Description | Part No.
GC Basic Installation Kit Includes copper tubing, column nuts, a gas trap for the carrier gas, and five wrenches | 5182-3453

Fittings

Brass nut and ferrule set, 5080-8750

Stainless steel front ferrules, 5180-4108

Front ferrules, stainless steel, 5181-1292

Front ferrules, 5180-4109

Front ferrules, 5180-4111

Back ferrules, 5180-4115

Back ferrules, 5180-4117

1/8 in brass cap, 5180-4121

1/4 in brass cap, 5180-4120

1/8 in plug, 5180-4124

1/4 in plug, 5180-4125

Caps
Description | Unit | Brass
1/8 in | 6/pk | 5180-4121
1/4 in | 6/pk | 5180-4120

Plugs |  |
Description | Unit | Brass
1/8 in | 6/pk | 5180-4124
1/8 in | 1/ea | 0100-0071
1/6 in | 1/ea | 0100-1315
1/4 in | 6/pk | 5180-4125

Blanking Nut
Description | Unit | Stainless Steel
1/16 in | 1/ea | 01080-83202

Adapter
Description | Unit | Brass
1/8 in × 1/8 in | 1/ea | 0100-0420

Hose Connector |  |
Description | Unit | Brass
1/16 in | 10/pk | 5180-4148

Stainless steel blanking nut, 01080-83202

Brass adapter, 0100-0420

Low dead volume tee, 0100-0782

Stainless steel tee, 0100-0542

Low dead volume tee, 5180-4160

Brass cross, 0100-0161

Brass cross, 0100-0985

Brass union, 0100-1316

Stainless steel union, 0100-0124

1/8 in brass union, 5180-4127

1/4 in brass union, 5180-4128

ZDV union with fittings, 0100-0900

Crosses |  |
Description | Unit | Brass
1/8 in | 1/ea | 0100-0161
1/8 in | 1/ea | 0100-0996
1/4 in | 1/ea | 0100-0985

Elbows
Description | Unit | Brass
1/8 in | 1/ea | 0100-0091
1/8 in | 1/ea | 0100-0092

Zero Dead Volume Unions
Description | Unit | Stainless Steel
1/16 in | 1/ea | 0100-0900

Connector (Swagelok-style to male NPT), 5180-4143

Connector (Swagelok-style to male NPT), 5180-4145

Connector (Swagelok-style to female NPT), 0100-0118

Connector (Swagelok-style to female NPT), 0100-0119

Reducing union, 5180-4130

Reducing union, 5180-4131

Reducing union, 0100-0241

Reducing union, 0100-0121

Reducer, 5180-4135

Reducer, 5180-4134

Front ferrules, 5180-4109

Front ferrules, 5180-4111

Back ferrules, 5180-4115

1/4 in brass cap, 5180-4120

1/8 in brass cap, 5180-4121

1/8 in plug, 5180-4124

1/8 in brass union, 5180-4127

1/4 in brass union, 5180-4128

Low dead volume tee, 5180-4160

Fittings Kit
Description | Unit | Part No.
Fittings Kit: Includes items below |  | 5180-4161
1/8 in nut, brass | 10/pk | 5180-4103
1/4 in nut, brass | 10/pk | 5180-4105
1/8 in front ferrule, brass | 10/pk | 5180-4109
1/4 in front ferrule, brass | 10/pk | 5180-4111
1/8 in back ferrule, brass | 10/pk | 5180-4115
1/4 in back ferrule, brass | 10/pk | 5180-4117
1/4 in cap, brass | 6/pk | 5180-4120
1/8 in cap, brass | 6/pk | 5180-4121
1/8 in plug, brass | 6/pk | 5180-4124
1/4 in plug, brass | 6/pk | 5180-4125
1/8 in union, brass | 2/pk | 5180-4127
1/4 in union, brass | 2/pk | 5180-4128
1/8 in tee, brass | 2/pk | 5180-4160
1/4 in tee, brass | 2/pk | 5180-4129
1/8 × 1/4 in reducing union, brass | 2/pk | 5180-4131
1/4 in (A) × 1/8 in (B) reducer, brass | 2/pk | 5180-4134
1/8 in (A) × 1/4 in (B) reducer, brass | 2/pk | 5180-4135

Tools

General Laboratory Tool Kit

The general laboratory tool kit includes the following items:

• Toolbox

• Flashlight

• 8 in bastard file

• 6 in adjustable wrench

• 12 in adjustable wrench for use with regulator

• No. 1 pt, 3 in Pozidriv shaft, fits no. 2-4 screws

• No. 2 pt, 4 in Pozidriv shaft, fits no. 5-10 screws

• Flathead screwdriver, 2 in steel shaft, 1/8 in blade

• Flathead screwdriver, 4 in steel shaft, 1/4 in blade

• Hex key set, 1.5, 2, 2.5, 3, 4, 5, and 6 mm keys

• 6 in long jaw needle nose pliers with side cutters

• Three open-end wrenches
(1/4 × 5/16 in, 1/2 × 9/16 in, 7/16 × 3/8 in)

• Snoop-liquid leak detector

• PTFE tape

Description | Part No.
General laboratory tool kit | 5180-4162

General laboratory tool kit, 5180-4162

Wrenches |
Description | Part No.
Open end wrench, 1/4 and 5/16 in | 8710-0510
Wrench, 1/2 and 7/16 in | 8710-0806
Open end wrench, 7/16 and 9/16 in | 8710-0803
Open end wrench, 7/16 and 3/8 in | 8710-0972
Adjustable wrench, 12 in, for use with regulators | 8710-1712
Open end wrench, 9/16 and 5/8 in | 8720-0010
Open end wrench, 1/2 and 9/16 in | 8720-0025
Open end wrench, 14 mm | 8710-1924
Open end wrench, 12 mm, 116 mm long | 8710-1841
Open end wrench, 4 mm | 8710-1534

HPLC system tool kit, G4203-68708

LC Tool Kits |
Description | Part No.
HPLC system tool kit | G4203-68708
Compact tool kit | G4296-68715

Screwdrivers |
Description | Part No.
Screwdriver, 3 in Pozidriv shaft No. 1 pt | 8710-0899
Screwdriver, 4 in Pozidriv shaft No. 2 pt | 8710-0900
Screwdriver, Torx T10 | 5182-3466
Screwdriver, Torx T20 | 5182-3465

Pliers and Tweezers |  |
Description | Part No.
Needle nose pliers, pointed serrated jaws | 8710-0004
Tweezers, 4-3/4 in long | 8710-0007
Truarc pliers | 8710-0018

Plastic tubing cutter, 8710-1930

Tube Cutters and Replacement Blades |  |
Description | Unit | Part No.
Precision tubing cutter for 1/16 in stainless steel tubing |  | 5190-1442
Hi-duty tubing cutter, 1/8 to 1-1/8 in od tubing |  | 8710-1707
Hi-duty tubing cutter blades | 5/pk | 8710-1708
Tubing cutter, 1/8 to 5/8 in od tubing |  | 8710-1709
Plastic tubing cutter |  | 8710-1930
Blades for plastic cutter, 5/pk | 5/pk | 8710-1931

Hex keys, Rheotool, 5064-8211

Hex Keys |
Description | Part No.
Hex key set: 1.5, 2, 2.5, 3, 4, and 5 mm keys, 1090A (5880/90A) | 8710-0641
Hex key, 4 mm, 15 cm long, T-handle | 8710-2392
Hex key, 3 mm, 12 cm long, straight handle | 8710-2411
Hex key, 2.5 mm, 15 cm long, straight handle | 8710-2412
Hex key, 1.5 mm, 10 cm long, straight handle | 8710-2393
Hex key, 9/64 in, 15 cm long, T-handle | 8710-2394
Hex key, 4.0 mm, 10 cm long, straight handle | 5965-0027
Hex key, 2.5 mm, 10 cm long, straight handle | 5965-0028
Tool kit hex keys, Rheotool* Includes 3 hex keys, 4 mm, 1.5 mm, and 9/64 in, with straight or T-handle plus Rheotool | 5064-8211

*These tools are recommended for easier repair and maintenance of LC modules.

GC Column Accessories

Capillary Column Installation Kit

The Capillary Column Installation Kit contains:

• Diamond-tipped pencil

• 20x magnifier

• Ferrule removal tool

• Septum removal tool

• Refillable 2 oz bottle of Snoop

Column installation kit, 430-2000

Description | Part No.
Capillary Column Installation Kit with diamond-tipped cutting pencil | 430-2000

Capillary Column Rinse Kit

This kit makes solvent rinsing easy! Solvent rinsing removes many contaminants that accumulate in columns. The contaminants are removed by passing solvents through the column. Only bonded and cross-linked phase columns should be rinsed, or permanent damage to the column will result.

Description | Part No.
Capillary Column Rinse Kit | 430-3000

Column rinse kit, 430-3000

TIPS & TOOLS |
View the latest Agilent J&W GC column focused applications, products and educational resources at www.agilent.com/chem/mygccolumns | [picture]

Fused silica tubing cutters

Fused Silica Tubing Cutters

We offer a conveniently designed, pencil-shaped tool and a ceramic wafer that allow you to make clean and easy cuts in fused silica, glass and aluminum-clad capillary columns.

Description | Part No.
Diamond-tipped column cutting pencil | 420-1000
Ceramic wafer column cutter, 4/pk | 5181-8836
Column cutter with rotating diamond blade | 5183-4620
Replacement diamond blade (for 5183-4620) | 5183-4621

Column Baskets and Hangers |
Description | Part No.
13 cm, 5 in basket for 6850 capillary columns | 19091-80060
Column hanger for 5 in basket | G2630-80800
Column hanger clip kit for 7 in basket | G1530-61580
Column hanger for 6890, 5890, 5880A | 1460-1914

Column cutting tool, 5183-4620

Miscellaneous Tools

Ferrule Tools

Remove ferrules stuck inside fittings. Screw the stainless steel ferrule tool into the ferrule and pull it out. Use the smaller capillary ferrule tool for capillary column ferrules (0.32 mm id column and smaller). The megabore ferrule tool is used for megabore ferrules. The liner tool can be used to remove polyimide and tubing from inside a megabore liner. The column ferrule installation tool positions a ferrule onto a capillary column for proper installation.

Capillary and megabore ferrule tool

Description | Part No.
Capillary ferrule tool | RFT-2500
Megabore ferrule tool | RFT-5300
Column ferrule installation tool | 19251-80680
MS interface column installation tool | G1099-20030

20x Magnifier

Examine column ends for proper cuts. Jagged, rough, or non-perpendicular cuts negatively affect chromatographic performance.

Description | Part No.
20x Magnifier | 430-1020

Magnifier, mirror, microprobes

Microprobes

Hardened stainless steel probes remove septum and ferrule pieces stuck in fittings. Five different styles give you all of the angles necessary for getting into those hard-to-reach places.

Description | Part No.
Microprobes | RMP-5005

Mirror

Inspect injection ports, the inside of fittings, and other hard-to-reach places.

Description | Part No.
Mirror | 707-0027

Snoop

Snoop

Leak test most pressurized gas systems. We recommend that leak detecting solutions be used with care where there is any possibility of the fluid being aspirated into gas flow streams supplying the column or detector. This squeezable bottle comes with a “Snooper Tube” extendable up to 12 in (30 cm). Electronic leak detectors are preferred. In their absence, a volatile nonreactive solvent like isopropanol may be used. Use caution to avoid aspiration of materials such as Snoop into the column.

Description | Part No.
Snoop, 8 oz (236 mL) bottle | 9300-0311
Snoop, 1 gallon bottle | 460-1002

Injection Port Cleaning Kit

If changing the liner and trimming the column does not remove contamination from your injection port, you probably need to clean and flush your injection port. Three stainless steel brushes and a scraper are the ideal tools for removing sample residue and septum particles. The stainless steel brushes have diameters of 5 mm, 1/4 in, and 3/8 in.

Injection port cleaning kit, 480-0003

Description | Part No.
Injection Port Cleaning Kit | 480-0003

Septum tool with knurled handle, 450-1000

Miscellaneous Injection Port Tools |
Description | Part No.
Septum tool, knurled handle | 450-1000
Ferrule removal tool | 440-1000
Capillary inlet cleaning wires, 5/pk | 5180-4153
Cotton swabs, 100/pk | 5080-5400

Capillary inlet cleaning wires, 5180-4153

FID Cleaning Kit

This easy-to-use maintenance kit improves sensitivity, reduces noise, and decreases detector spiking.

FID cleaning kit, 9301-0985

Description | Part No.
FID cleaning kit | 9301-0985

12-Piece File Set

This 12-piece file set scores glass, removes burrs from metal tubing, and cleans threads. The files are 5-1/2 in long.

Description | Part No.
12-Piece File Set | RSF-1200

Electrochemistry Meters, Electrodes, and Solutions

Analyst-friendly features optimize your measurements and ensure accuracy

Your rapidly changing work environment demands speed and productivity without jeopardizing results. That is why all Agilent meters and electrodes are designed for easy operation, even by non-technical users, while still producing the most reliable readings.

3200P standard pH meter, G4383A

User-friendly control panel simplifies your measurements and ensures accurate results, regardless of technical knowledge or skill level.

Every Agilent Meter is backed by our 3-year replacement guarantee.

• Unique electrode reference system, backed by our qualified material and manufacturing process, delivers fast, reliable response during meter operation

• Rugged design stands up to the toughest indoor and outdoor conditions

• High-endurance protective glass and multi-layer composite electrodes prevent breakage caused by frequent use, even in demanding environments

3200P pH Meter

3200P pH Meter Specifications*
Specifications |  | 3200P
Range | pH | -2.000-20.000 pH
| mV | -1999.9-1999.9 mV
| Temperature | -5.0-110.0 °C
Resolution | pH | 0.1/0.01/0.001 pH
| mV | 0.1 mV
| Temperature | 0.1 °C
Accuracy | pH | ±0.002 pH
| mV | ±0.03% FS
| Temperature | ±0.1 °C
Temperature compensation |  | Manual/Auto -5.0-110.0 °C
Power |  | Universal AC power adapter 100 V-240 V, 50/60 Hz**
Dimension (L×D×H) [mm] |  | 190×190×105
Weight (kg) |  | 1

*EC Print software for easy and direct printing and EC Firmware software are available for free download at www.agilent.com/chem/phmeters

**Shipped with meter

3200P standard pH meter, G4383A

3200M Multi-parameter Meter

Simultaneously measure pH/pX, ion concentration, ion electrode potential (mV), conductivity (TDS, salinity), DO (concentration and saturation), temperature, and more.

3200M multi-parameter meter, G4387A

3200M Multi-parameter Analyzer Specifications*
Specifications |  | 3200M
Range | pH | -2.000-20.000 pH
| pX | 0.000-14.000 pX
| mV | -1999.9-1999.9 mV
| Conductivity | 0.000 μS/cm-2000 mS/cm
| Resistivity | 5.00 Ω.cm-100.0 MΩ.cm
| TDS | 0.000 mg/L-1000 g/L
| Salinity | 0.00%-8.00% (Chinese version) 0.0-80.0 g/L (English version)
| DO | 0-45.00 mg/L
| DO saturation | 0.0-300.0%
| Ion concentration | 0-19990
|  | -5.0-110.0 °C
| Temperature | -5.0-110.0 °C
Resolution | pH/pX | 0.1/0.01/0.001 pH/pX
| mV | 0.1 mV
| Ion concentration | Four effective digits (Scientific notation)
| DO | 0.01 mg/L
| DO saturation | 0.1%
| Temperature | 0.1 °C
Accuracy | pH/pX | ±0.002 pH/pX:pXII:± 0.005 pX
| mV | ±0.03% FS
| Ion concentration | ±0.3%
| Conductivity | ±0.5% FS
| Resistivity | ±0.5% FS
| TDS | ±0.5% FS
| Salinity | ±0.1%
| DO | ±0.10 mg/L
| DO saturation | ±2.0%
| Temperature | ±0.1 °C
Power |  | Universal AC power adapter 100 V-240 V, 50/60 Hz**
Dimensions (LxDxH) [mm] |  | 190×190×105
Weight (kg) | 1 | 1

*EC Print software for easy and direct printing and EC Firmware software are available for free download at www.agilent.com/chem/phmeters

**Shipped with meter

3200I Ion Meter

When matched with an ion-selective electrode and reference electrode, ion meters can measure corresponding electrode potential (mv), pX, and ion concentration.

3200I ion meter, G4386A

3200I Ion Meter Specifications*
Specifications |  | 3200I
Range | pH | -2.000-20.000 pH
| pX | 0.000-14.000 pX
| mV | -1999.9-1999.9 mV
| Ion concentration | 0-19990
| Concentration unit | mol/L, mmol/L, g/L, mg/L, μg/L (Chinese version) mol/L, mg/L, %, mg/L, μg/L (English version)
| Temperature | -5.0-110.0 °C
Resolution | pX | 0.1/0.01/0.001 pH/pX
| mV | 0.1 mV
| Ion concentration | Four effective digit (Scientific notation)
| Temperature | 0.1 °C
Accuracy | pX | ±0.002 pH/pX:pXII: ±0.005 pX
| mV | ±0.03% FS
| Ion concentration | ±0.3%
| Temperature | ±0.1 °C
Power |  | Universal AC power adapter 100 V-240 V, 50/60 Hz**
Dimension (L×D×H) [mm] |  | 190x190x105
Weight (kg) |  | 1

*EC Print software for easy and direct printing and EC Firmware software are available for free download at www.agilent.com/chem/phmeters

**Shipped with meter

3200C conductivity meter, G4384A

3200C Conductivity Meter

Measure conductivity, resistivity, total dissolved solid (TDS), salinity, and present solution temperature.

3200C Conductivity Meter Specifications*
Specifications |  | 3200C
Range | Conductivity | 0.000 μS/cm-2000 mS/cm
| Resistivity | 5.00 Ω.cm-100.0 MΩ.cm
| TDS | 0.000 mg/L-1000 g/L
| Salinity | 0.00%-8.00% (Chinese version) 0.0-80.0 g/L (English version)
| Temperature | -5.0-110.0 °C
Resolution | Conductivity | Four effective digital, and the lowest level is 0.001 μS/cm
| Temperature | 0.1 °C
Accuracy | Conductivity | ±0.5% FS
| Resistivity | ±0.5% FS
| TDS | ±0.5% FS
| Salinity | ±0.1%
| Temperature | ±0.1 °C
Cell constant |  | 0.001, 0.01, 0.1, 1.0, 10, 100 cm-1
Compensation range of cell constant | ±20% of Standard constant value
Temperature compensation range | 0-50.0 °C
Conductivity and TDS standard temperature | 25.0 °C
Salinity standard temperature |  | 18.0 °C
Power |  | Universal AC power adapter 100 V-240 V, 50/60 Hz**
Dimension (L×D×H) [mm] |  | 190×190×105
Weight (kg) |  | 1

*EC Print software for easy and direct printing and EC Firmware software are available for free download at www.agilent.com/chem/phmeters

**Shipped with meter

3200D Dissolved Oxygen Meter

Membrane electrode measures DO concentration and saturation of water solutions.

3200D dissolved oxygen meter, G4385A

3200D Dissolved Oxygen Meter Specifications*
Specifications |  | 3200D
Range | DO | 0-45.00 mg/L
| DO saturation | 0.0-300.0%
| Temperature | -5.0-110.0 °C
Resolution | DO | 0.01 mg/L
| DO saturation | 0.1%
| Temperature | 0.1 °C
Accuracy | DO | ±0.10 mg/L
| DO saturation | ±2.0%
| Temperature | ±0.1 °C
Temperature compensation |  | Automatic: 0.0-45.0 °C
Standard temperature |  | 20±1 °C
Salinity calibration |  | 0.0-50.0 g/L
Barometric pressure calibration |  | 60.0-110.0 kPa
Power |  | Universal AC power adapter 100 V-240 V, 50/60 Hz**
Dimension (L×D×H) [mm] |  | 190×190×105
Weight (kg) |  | 1

*EC Print software for easy and direct printing and EC Firmware software are available for free download at www.agilent.com/chem/phmeters

**Shipped with meter

Agilent Electrochemistry Meters: rigorously evaluated for durability and safety

Our environmental test specifications ensure that Agilent Electrochemistry Meters will be rugged performers in your lab, just like Agilent columns and instruments.

Environmental Test Specifications
Operating ambient temperature | 0-50 °C
Operating relative humidity | 5-95%, no condensation
Storage temperature | Meter: -40-70 °C; Electrode: -15-55 °C
Vibration and shock | Instrument test and package test

Module Specifications

Module specifications

Agilent provides modules to fit your most challenging applications.

Module | Specifications | Benefits
3200P | Temperature: -5.0-110.0 °C | Compatible with a wide temperature range
3200C | Measuring mode: continuous/timed reading/auto-lock | Lets you perform a variety of measurements with one meter
3200D | Dot-matrix LCD | Fast interpretation of results
3200I |  | Easy for novices to use
3200M | Numeric operating keys | Simplified operation for all skill levels
3200P | Automatic identification for buffers | Choice of NIST and GB buffers
3200I | Impedance: 3x10¹² Ω | Choose from a wider range of electrodes for your sample
3200M | Accuracy of DO: ±0.10 mg/L | Precise measurements and excellent temperature compensation provide outstanding DO accuracy
3200I 3200M | Provides Ion measurement modes for H+, Ag+, Na+, K+ NH₄+, Cl-, F-, NO₃-, BF₄-, CN-, Cu²+, Pb²+ and Ca²+ | Easily exchanged electrodes (or ISEs) allow flexible multi-ion analysis
| Different units can be switched freely | Automatic functions optimize measurements and ensure accurate results
| Measuring mode in ion concentration: direct reading, “Standard” addition, sample addition, GRAN plot addition | Convenience

3200EA electrode holder, G4389A

Wide range of Agilent electrodes help meet the needs of any application

Unlike single-layer breathable membrane electrodes, Agilent electrodes are made from multi-layered composite materials for extra durability. They also feature a specific barrier to protect the glass bubble against breakage.

What’s more, the unique reference system on every Agilent electrode is backed by our uncompromising materials quality and manufacturing process – giving you fast response and high accuracy.

The electrodes shown here use universal connections, so you can use them interchangeably on Orion 3 star, 4 star meter, Hanna HI2221, and Mettler FE20pH.

ORP8211 ORP electrode, 5190-3999

Recommended uses*

ORP8211

Oxygen Reduction Potential (ORP) measurement of:

• Conventional water

• Wastewater

• Electroplate liquid

• Biological samples

I9111

• Fluoride water samples

• Surface water

• Drinking water

• Industrial effluent

I9121

• Ammonium/ammonia-containing water samples

• River and lake water

• Tap water

• Environmental protection/sewage

I9131

• Conventional sodium water samples

• Water treatment

• Power plant

• Industrial process control

*Laboratory test; for reference only

ORP8211 Oxidation Reduction Potential Electrode Specifications
Measurement range | ± 1999 mV
Potential accuracy | 263 ± 10 mV
Reference type | Ag/AgCl
Liquid junction material | Ceramic

R8111 Reference Electrode Specifications
Potential accuracy | ± 4 mV
Internal impedance | ≤ 1 kΩ
Reference type | Ag/AgCl
Liquid junction material | Ceramic
Reference filling solution | AgCl, 3 mol/L KCl

T7111 Automatic Temperature Compensation Probe Specifications
Measuring range | 0-100 °C
Accuracy | ± 0.3 °C 0-60 °C ± 1.0 °C 60-100 °C

D6111 Dissolved Oxygen Probe Specifications
Measuring range | 0-20 mg/L
Zero oxygen current | 1% FS (5 min)
Response time (90%) | 30 s
Temperature accuracy | ± 0.5 °C

All-in-one Packages
Description | Recommended Use | Part No.
Agilent 3200P Benchtop pH Meter Basic Package Includes: | Stable, accurate measurement of organic solution samples in fields such as scientific research, education, and chemical analysis | G4391A
Agilent 3200P benchtop pH meter |  | G4383A
Agilent 3200EA electrode holder |  | G4389A
P3211 pH combination electrode, includes 30 mL reference solution |  | 5190-3988
T7111 ATC probe |  | 5190-3998
pH buffer solutions, 4.01, 7.00, 10.01, NIST traceable, 250 mL, 3/pk |  | 5190-0533*
pH buffer solutions, 4.00, 6.86, 9.18, GB traceable, 250 mL, 3/pk |  | 5190-0534**
Agilent 3200P Benchtop pH Meter Package with 3-in-1 Electrode Includes: | Ordinary physical and chemical analysis in fields such as conventional water quality, education, and chemical analysis | G4392A
Agilent 3200P benchtop pH meter |  | G4383A
Agilent 3200EA electrode holder |  | G4389A
P3311 pH triode combination electrode, includes 30 mL reference solution |  | 5190-3990
pH buffer solutions, 4.01, 7.00, 10.01, NIST traceable, 250 mL, 3/pk |  | 5190-0533*
pH buffer solutions, 4.00, 6.86, 9.18, GB traceable, 250 mL, 3/pk |  | 5190-0534**
Agilent 3200C Benchtop Conductivity Meter Basic Package Includes: | Best for applications such as conventional surface water, drinking water, environmental water testing, and process analysis | G4393A
Agilent 3200C benchtop conductivity meter |  | G4384A
Agilent 3200EA electrode holder |  | G4389A
C5111 conductivity probe |  | 5190-3994
T7111 ATC probe |  | 5190-3998
Agilent 3200C Benchtop Conductivity Meter Package for Pure Water Analysis Includes: | Low-conductivity sample measurement of distilled water, boiler water, and pure water in fields such as energy, pharmacy, biology, and food safety | G4394A
Agilent 3200C benchtop conductivity meter |  | G4384A
Agilent 3200EA electrode holder |  | G4389A
C5113 conductivity probe |  | 5190-3996
T7111 ATC probe |  | 5190-3998
Agilent 3200D Benchtop Dissolved Oxygen Meter Package Includes: | DO measurement of conventional water in applications such as environmental, monitoring, aquaculture, sewage treatment, drinking water and research | G4395A
Agilent 3200D benchtop dissolved oxygen meter |  | G4385A
Agilent 3200EA electrode holder |  | G4389A
D6111 DO probe, 30 mL bottle of DO filling solution |  | 5190-3997
Agilent 3200I Benchtop Ion Meter Basic Package Includes: | pH measurement and ion analysis in fields such as scientific research, process analysis, biochemistry, and pharmacy (different ion, different electrode) | G4396A
Agilent 3200I benchtop ion meter |  | G4386A
Agilent 3200EA electrode holder |  | G4389A
T7111 ATC probe |  | 5190-3998
pH buffer solutions, 4.01, 7.00, 10.01, NIST traceable, 250 mL, 3/pk |  | 5190-0533*
pH buffer solutions, 4.00, 6.86, 9.18, GB traceable, 250 mL, 3/pk |  | 5190-0534**
P3211 pH combination electrode, includes 30 mL reference solution |  | 5190-3988
Agilent 3200I Benchtop Fluoride Ion Meter Package Includes: | Measurement of samples such as fluoride water, surface water, drinking water, and industrial effluent | G4397A
Agilent 3200I benchtop ion meter |  | G4386A
Agilent 3200EA electrode holder |  | G4389A
T7111 ATC probe |  | 5190-3998
I9111 fluoride combination ISE, includes 30 mL reference solution |  | 5190-4002
Agilent 3200M Benchtop Multi-Parameter Analyzer Package Includes: | pH, conductivity, and DO measurement; ion analysis in a wide range of fields (different ion, different electrode) | G4398A
Agilent 3200M benchtop multi-parameter analyzer |  | G4387A
Agilent 3200EA electrode holder |  | G4389A
P3211 pH combination electrode, includes 30 mL reference solution |  | 5190-3988
T7111 ATC probe |  | 5190-3998
pH buffer solutions, 4.01, 7.00, 10.01, NIST traceable, 250 mL, 3/pk |  | 5190-0533*
pH buffer solutions, 4.00, 6.86, 9.18, GB traceable, 250 mL, 3/pk |  | 5190-0534**
D6111 DO probe, 30 mL bottle of DO filling solution |  | 5190-3997
C5111 conductivity probe |  | 5190-3994

*Default, if not specified otherwise

**For China customers only

Electrochemistry Meters*
Description | Part No.
Agilent 3200P benchtop pH meter | G4383A
Agilent 3200C benchtop conductivity meter | G4384A
Agilent 3200D benchtop dissolved oxygen meter | G4385A
Agilent 3200I benchtop ion meter | G4386A
Agilent 3200M benchtop multi-parameter analyzer | G4387A
Accessories
Agilent 3200SA stirrer | G4388A
Agilent 3200EA electrode holder | G4389A

*EC Print software for easy and direct printing and EC Firmware software are available for free download at www.agilent.com/chem/phmeters

3200SA stirrer, G4388A

P3211 pH combination electrode, 5190-3988

P3212 pH combination electrode, 5190-3989

P3311 pH triode combination electrode, 5190-3990

P3111 pH electrode, 5190-3991

P3213 pH combination electrode, 5190-3992

P3214 pH combination electrode, 5190-3993

C5111 Conductivity probe, 5190-3994

C5112 Conductivity probe, 5190-3995

C5113 Conductivity probe, 5190-3996

D6111 DO probe, 5190-3997

7T111 ATC probe, 5190-3998

ORP8211 ORP electrode, 5190-3999

R8111 Reference electrode, 5190-4003

I9111 Fluoride combination ISE, 5190-4002

I9121 Ammonia combination ISE, 5190-4004

I9131 Sodium combination ISE, 5190-4005

Electrodes*
Description | Kit Contents | Part No.
P3211 pH combination electrode | Includes 30 mL reference solution | 5190-3988
P3212 pH combination electrode |  | 5190-3989
P3311 pH triode combination electrode | Includes 30 mL reference solution | 5190-3990
P3111 pH electrode |  | 5190-3991
P3213 pH combination electrode | Includes 30 mL reference solution | 5190-3992
P3214 pH combination electrode |  | 5190-3993
C5111 conductivity probe |  | 5190-3994
C5112 conductivity probe |  | 5190-3995
C5113 conductivity probe |  | 5190-3996
D6111 DO probe | Includes 30 mL DO Filling Solution | 5190-3997
T7111 ATC probe |  | 5190-3998
ORP8211 ORP electrode | Includes 30 mL reference solution | 5190-3999
R8111 reference electrode | Includes 30 mL reference solution | 5190-4003
I9111 fluoride combination ISE | Includes 30 mL reference solution | 5190-4002
I9121 ammonia combination ISE | Includes 30 mL reference solution | 5190-4004
I9131 sodium combination ISE | Includes 30 mL reference solution | 5190-4005

*All electrodes ship with a certificate of conformance and the certificate is also available online in the literature library

Chemicals*
Description | Amount | Part No.
pH buffer solutions, 4.01, 7.00, 10.01, NIST traceable | 3 × 250 mL | 5190-0533
pH buffer solutions, 4.00, 6.86, 9.18, GB traceable | 3 × 250 mL | 5190-0534
pH buffer, 4.01 | 3 × 250 mL | 5190-0535
pH buffer, 10.01 | 3 × 250 mL | 5190-0536
pH buffer, 7.00 | 3 × 250 mL | 5190-0537
pH buffer, 4.00 | 3 × 250 mL | 5190-0538
pH buffer, 6.86 | 3 × 250 mL | 5190-0539
pH buffer, 9.18 | 3 × 250 mL | 5190-0540
Ammonia electrode membrane, 5 pieces |  | 5190-0543
Ammonia Reference Solution | 3 × 30 mL | 5190-0544
Reference solution, pH | 3 × 250 mL | 5190-0545
Sodium ISE Reference Solution | 3 × 30 mL | 5190-0546
DO filling solution | 3 × 30 mL | 5190-0547
DO membrane sleeve, 3 pieces | 3 × 30 mL | 5190-0548
Accessories
Power adapter, E15WCP1-090100SPA |  | 5185-8389
B620 stirring bar |  | G4388-27000
BNC-50J short circuit plug |  | G4383-40000
ATC temperature diagnostic tool |  | 5185-8390
Conductivity diagnostic tool |  | 5185-8391

*Certificates of analysis ship with this product and are also available online in the literature library.

Agilent reference and filling solutions

Ammonia electrode membrane, 5190-0543

Power adapter, 5185-8389

B620 stirring bar, G4388-27000

BNC-50J short circuit plug, G4383-40000

ATC temperature diagnostic tool, 5185-8390

Conductivity diagnostic tool, 5185-8391

Integrators, Integrator Supplies and Cables

Information generation and presentation have never been more important. Agilent understands that data handling supplies are essential. We provide a convenient way to purchase ink cartridges and integrator supplies at the same time as other laboratory supplies so you never run out at a crucial moment.

Ink cartridge, 5181-1220

Integrator Cartridges and Printheads

Description | Part No.
Ink cartridge, Agilent 3397A, 3396 Series III, 3396A and B, 3395, 3394 | 5181-1220
Printhead for 3388A and 5880A | 19350-60540

Integrator Paper and Supplies

Paper and Supplies for Agilent 3397A, 3396 Series II, and 3396A/B/95/94
Description | Unit | Part No.
Z-fold paper, sequentially numbered, 8.5 × 11 in, 500 sheets/pk, Inkjet | 5/pk | 5062-3561
Perforated paper, 8.5 × 11 in rolls, Inkjet | 4/pk | 5181-1219
Perforated paper, sequentially numbered, 8.5 × 11 in rolls, Inkjet | 4/pk | 5183-2009
Perforated paper, A4 size rolls, Inkjet | 4/pk | 5181-1255
Replacement paper roll rod |  | 03394-20500
Replacement paper roll brackets | 2/pk | 03396-40050

Thermal Paper for Agilent 3390/92/93
Description | Unit | Part No.
Thermal printing paper, blue print, 4.209 in (106.9806 mm) wide × 400 ft | 4 rolls/pk | 5080-8800

Thermal Paper for Agilent 338X/5830/3370
Description | Unit | Part No.
Z-fold paper, black print, 8.5 in wide | 8 pk/box | 9270-0658

Cables

3396 Series III Cable Sets
Description | Part No.
Series III Integrator General Purpose cables, signal/remote cable pair includes 35900-60630 and 03396-61031 | G2108A
INET interface for integrators, provides INET communications and dual-channel output, includes 1 INET cable | G1553A

Cables to Connect 3394/95A and 3396A/B Integrator
| Cable Type
Instrument | Analog | Remote
6890 Series GC | G1530-60570 |
| 03396-61020 | 03396-61010
5890 GC | 35900-60610 |
General Purpose | 35900-60630 |
| 35900-60900 | 35900-60920

HPIB and GPIB Cables
Description | Part No.
PCI GPIB Card for Win95/98/NT (82350A/B) | G1680-63715
HPIB Cable 2 m (10833B) | 10833B-2310
General Purpose Cable GPIO, open end | G1103-61611
HPIB Cable, 8 m (10833G) | 10833G-2310
Cable, 6890 to PC 9F/9F RS232 | G1530-60600
Crossover Ethertwist Cable, 10 ft | 5183-4649
Adapter, extends GPIB connector (10834A) | 10834A-2310

Instrument Interface Cables
Description | Part No.
Signal cable, general purpose analog output cable assembly, spade lugs/6 pins | G1530-60560
External event control, cable, 8 pins/spade lugs | G1530-60590
Remote start cable for general use with lug | 35900-60670
6890 to PC via RS 232-C, 9 female/25 male user card cable | G1530-60610
General purpose binary-coded decimals cable with spade lugs | G1530-60630
Automatic liquid sampler; remote start/stop cable, 2 m 9 male/9 female | G1530-60930
HPIL cable, 5 m | 82167-60003
Remote Y Cable, G1512/5890A to 3396C | G1512-60530
Remote Cable to 5890 | 35900-60700

Product Index

CTC Autosampler Supplies

CombiPAL Headspace Syringes

CombiPAL and GC PAL Liquid injection

Syringes

HTS and HTC PAL Liquid Injection

Crimp Top Micro Vials and Caps

Syringes

Valve Loops and Needle Seals

Sample Trays

Well Plates

Crimping and Decapping Tools

Electronic Crimpers and Decappers

Manual Crimpers and Decappers

Electrochemistry

All-in-one Packages

Chemicals

Electrode Recommended Uses

Electrode Specifications

Conductivity Probe

D6111 Dissolved Oxygen Probe

Ion Selective

ORP8211 Oxidation Reduction

Potential Electrode

R8111 Reference Electrode

T7111 Automatic Temperature Compensation

Probe

pH Electrode

Electrodes

Environmental Test Specifications

Meter Specifications

3200C Conductivity Meter

3200D Dissolved Oxygen Meter

3200I Ion Meter

3200M Multi-parameter Analyzer

3200P pH Meter

Meters

Module Specifications

Fittings

Adapter

Back Ferrules

Blanking Nut

Bulkhead Unions

Caps

Crosses

Elbows

Fittings Kit

Front Ferrules

Hose Connector

Nuts

Nuts, Front and Back Ferrule Sets

Plugs

Reducers

Reducing Unions

Tees

Unions

Zero Dead Volume Unions

Flow Meters

ADM Flow Meters

Precision Gas Flow Meter

GC Column Accessories

Capillary Column Installation Kit

Capillary Column Rinse Kit

Column Baskets and Hangers

Fused Silica Tubing Cutters

GC Installation Kits

Basic Installation

Tubing

With Gas Purifiers

With Tools (no gas purifiers)

Gas Purification

Connection Diagrams

Gas Clean Filters

Accessories

Connecting Units

Fittings

Replacement Filters

Starter Kits

Gas Cylinder Regulators

Gas Leak Detector

Gas Purifier Selection Guide

In-Line Gas Traps

Renewable Gas Purification System

Universal/External Split Vent Trap

In-Line Gas Traps

Big Hydrocarbon Traps (BHT Series)

Big Moisture Traps (BMT Series)

Big Oxygen Traps (BOT Series)

Big Universal Traps

Combination Traps

Hydrocarbon/Moisture Traps

Oxygen/Moisture Traps

Hydrocarbon Traps

Indicating Moisture Traps

Indicating Oxygen Traps

Oxygen Traps

Integrators

Cables

Cartridges

Paper

Syringes

Agilent Syringes

7673/7683 On-Column

Autosampler Syringes

Blue Line Autosampler Syringes

for 7693A ALS

Advanced Sample Enhancement

Fitted Plungers

PTFE-Tipped Plungers

Gold Standard Autosampler Syringes

Straight Needle, and 26 s Gauge

23-26s Gauge Tapered Needle,

HP 7670/71/72 Autosampler Syringes

LC Manual Syringes

Fitted Plungers

PTFE-Tipped Plungers

Manual Syringes

Fitted Plunger, Fixed and Removable

Needle

LC with Fitted Plungers

LC with PTFE-Tipped Plungers

Luer Lok Needles

PTFE-Tipped Plunger and Luer Lok

PTFE-Tipped Plunger, Fixed Needle

PTFE-Tipped Plunger, Removable Needle

Needle Gauge

Needle Termination

Needle Tip Design

CrossLab Syringes

Autosampler Syringes

for Bruker/Varian Systems

Autosampler Syringes

for CTC Analytics Systems

Autosampler Syringes for Dionex Systems

Autosampler Syringes

for PerkinElmer Systems

Autosampler Syringes for Shimadzu Systems

Autosampler Syringes for Thermo Systems

Autosampler Syringes for Waters Systems

Needle Gauge

Needle Termination

Tools

12 Piece File Set

20x Magnifier

FID Cleaning Kit

Ferrule Tools

General Laboratory Tool Kit

Hex Keys

Injection Port Cleaning Kit

LC Tool Kits

Microprobes

Mirror

Pliers and Tweezers

Screwdrivers

Snoop

Tube Cutters

Wrenches

Vials and Accessories

Agilent Vials

Crimp Top

2 mL Wide Opening Vials

Caps with mm Septa 20

Convenience Packs

LC

General Purpose

Bonded Caps

Sample Storage Vial Kits

Headspace

20 mm Caps and Septa

CombiPAL mm Screw Top Caps

with Septa

CombiPAL Screw Top Vials

Convenience Packs

Crimp Top Vials

High Performance Septa

High Recovery

MS Analyzed

Micro-V

Microvolume Inserts

Polypropylene

Screw Top

2 mL Standard Opening (8 mm) Vials

2 mL Wide Opening Vials

4 mL (13 mm) Vials

Caps for mL Vials

Convenience Packs

LC

Pre-assembled Packs

Screw Cap Pack for 7696 Sample Prep

Workbench

Septa for Wide Opening Caps

Septa Chemical Compatibility

Snap Top

2 mL (11 mm) Vials

Convenience Packs

Polyethylene Caps with mm Septa

Vial Identification Chart

CrossLab Vials

Crimp Top

2 mL (11 mm) Vials

Caps with mm Septa

Convenience Packs

Micro Vials

Cross Reference List

Headspace

Caps

Convenience Packs

Crimp Top Vials

High Performance Septa

Screw Top Vials

Micro-V

Microvolume Inserts

Polypropylene

Screw Top

10 mL (22 mm) Vials

2 mL Standard Opening (8 mm) Vials

2 mL Wide Opening (9 mm) Vials

2 mL Wide Opening Convenience Packs

4 mL (13 mm) Vials

6 mL (16 mm) Vials

Caps for mL Vials

Septa for Wide Opening Caps

Sealing Mats

Septa Selection

Snap Top

2 mL (11 mm) Vials

Caps with mm Septa

Convenience Packs

Storage Vial Convenience Packs

Vial Compatibility

Vial Identification Chart

Well Plates

Electronic Crimpers and Decappers

Manual Crimpers and Decappers

Part Number Index

0100-0053

0100-0057

0100-0058

0100-0071

0100-0073

0100-0088

0100-0089

0100-0090

0100-0091

0100-0092

0100-0110

0100-0111

0100-0118

0100-0119

0100-0121

0100-0124

0100-0126

0100-0128

0100-0132

0100-0133

0100-0161

0100-0208

0100-0241

0100-0420

0100-0542

0100-0680

0100-0782

0100-0900

0100-0969

0100-0985

0100-0996

0100-1189

0100-1315

0100-1316

01080-83202

03394-20500

03394-60540

03396-40050

03396-60560

03396-61010

03396-61020

0460-1266

07673-40180

10833B-2310

10833G-2310

10834A-2310

1460-1914

19091-80060

19199M

19199N

19251-80680

19350-60540

220-1170

220-1171-E

220-1171-U

2869463500

35900-60610

35900-60630

35900-60670

35900-60700

35900-60750

35900-60900

35900-60920

3700014600

420-1000

430-1020

430-2000

430-3000

440-1000

450-1000

460-1002

480-0003

5021-7107

5040-4649

5040-4667

5040-4668

5040-4669

5040-4671

5040-4681

5040-4682

5040-4683

5042-1386

5042-1388

5042-1389

5042-6454

5061-3370

5062-3561

5062-3582

5064-8211

5067-0205

5067-0218

5067-0219

5067-0220

5067-0223

5067-0226

5067-0227

5067-0234

5067-0246

5067-0247

5080-5400

5080-8750

5080-8751

5080-8752

5080-8753

5080-8800

5180-0805

5180-0806

5180-0841

5180-0842

5180-0844

5180-4102

5180-4103

5180-4104

5180-4105

5180-4106

5180-4108

5180-4109

5180-4110

5180-4111

5180-4113

5180-4114

5180-4115

5180-4116

5180-4117

5180-4120

5180-4124

5180-4125

5180-4127

5180-4128

5180-4129

5180-4130

5180-4131

5180-4134

5180-4135

5180-4143

5180-4145

5180-4148

5180-4149

5180-4153

5180-4161

5180-4162

5180-4196

5181-1210

5181-1211

5181-1212

5181-1215

5181-1216

5181-1217

5181-1219

5181-1220

5181-1255

5181-1267

5181-1270

5181-1273

5181-1292

5181-3319

5181-3321

5181-3354

5181-3356

5181-3358

5181-3360

5181-3361

5181-3365

5181-3375

5181-3376

5181-3377

5181-3400

5181-8801

5181-8806

5181-8808

5181-8809

5181-8810

5181-8811

5181-8813

5181-8836

5181-8866

5181-8872

5182-0540

5182-0541

5182-0542

5182-0543

5182-0544

5182-0545

5182-0546

5182-0547

5182-0548

5182-0550

5182-0551

5182-0552

5182-0553

5182-0554

5182-0555

5182-0556

5182-0557

5182-0558

5182-0564

5182-0566

5182-0567

5182-0714

5182-0715

5182-0716

5182-0717

5182-0718

5182-0719

5182-0720

5182-0721

5182-0722

5182-0723

5182-0724

5182-0725

5182-0726

5182-0727

5182-0728

5182-0729

5182-0730

5182-0731

5182-0732

5182-0733

5182-0734

5182-0735

5182-0736

5182-0737

5182-0830

5182-0831

5182-0832

5182-0833

5182-0834

5182-0835

5182-0836

5182-0837

5182-0838

5182-0839

5182-0840

5182-0864

5182-0865

5182-0866

5182-0867

5182-0868

5182-0869

5182-0871

5182-0875

5182-3453

5182-3454

5182-3457

5182-3458

5182-3459

5182-3465

5182-3466

5182-9201

5182-9202

5182-9211

5182-9401

5182-9402

5182-9411

5182-9622

5182-9626

5182-9734

5182-9799

5183-0314

5183-0316

5183-0318

5183-1941

5183-2009

5183-2030

5183-2042

5183-2058

5183-2067

5183-2068

5183-2069

5183-2070

5183-2071

5183-2072

5183-2073

5183-2074

5183-2075

5183-2076

5183-2077

5183-2078

5183-2079

5183-2080

5183-2081

5183-2082

5183-2083

5183-2085

5183-2086

5183-2088

5183-2089

5183-2090

5183-4301

5183-4302

5183-4303

5183-4304

5183-4305

5183-4306

5183-4307

5183-4308

5183-4311

5183-4312

5183-4313

5183-4314

5183-4321

5183-4322

5183-4323

5183-4324

5183-4331

5183-4332

5183-4333

5183-4334

5183-4428

5183-4429

5183-4432

5183-4433

5183-4436

5183-4437

5183-4438

5183-4442

5183-4448

5183-4450

5183-4459

5183-4460

5183-4461

5183-4464

5183-4474

5183-4475

5183-4477

5183-4478

5183-4479

5183-4480

5183-4487

5183-4491

5183-4492

5183-4493

5183-4494

5183-4495

5183-4496

5183-4497

5183-4498

5183-4499

5183-4500

5183-4504

5183-4505

5183-4506

5183-4507

5183-4508

5183-4509

5183-4510

5183-4511

5183-4518

5183-4620

5183-4621

5183-4641

5183-4642

5183-4643

5183-4644

5183-4645

5183-4649

5183-4728

5183-4729

5183-4730

5184-3550

5184-3551

5184-3552

5184-3554

5184-3555

5184-3556

5185-5820

5185-5823

5185-5824

5185-5829

5185-5838

5185-5861

5185-5862

5185-5863

5185-5864

5185-5865

5185-8389

5185-8390

5185-8391

5188-2753

5188-2758

5188-2759

5188-2788

5188-5246

5188-5247

5188-5369

5188-5370

5188-5371

5188-5386

5188-5390

5188-5392

5188-5395

5188-6457

5188-6458

5188-6460

5188-6461

5188-6462

5188-6463

5188-6464

5188-6465

5188-6466

5188-6467

5188-6468

5188-6469

5188-6470

5188-6471

5188-6476

5188-6477

5188-6478

5188-6479

5188-6485

5188-6486

5188-6487

5188-6488

5188-6489

5188-6490

5188-6491

5188-6492

5188-6535

5188-6536

5188-6537

5188-6538

5188-6572

5188-6593

5188-6594

5188-6596

5190-0464

5190-0535

5190-0536

5190-0537

5190-0538

5190-0539

5190-0540

5190-0543

5190-0544

5190-0545

5190-0546

5190-0547

5190-0548

5190-1414

5190-1442

5190-1457

5190-1460

5190-1461

5190-1462

5190-1463

5190-1464

5190-1465

5190-1466

5190-1467

5190-1468

5190-1469

5190-1470

5190-1471

5190-1472

5190-1473

5190-1474

5190-1475

5190-1476

5190-1477

5190-1478

5190-1479

5190-1480

5190-1481

5190-1482

5190-1483

5190-1484

5190-1485

5190-1486

5190-1487

5190-1488

5190-1489

5190-1490

5190-1491

5190-1492

5190-1493

5190-1494

5190-1495

5190-1496

5190-1497

5190-1498

5190-1499

5190-1500

5190-1501

5190-1502

5190-1503

5190-1504

5190-1505

5190-1506

5190-1507

5190-1508

5190-1509

5190-1510

5190-1511

5190-1512

5190-1513

5190-1514

5190-1515

5190-1516

5190-1517

5190-1518

5190-1519

5190-1520

5190-1521

5190-1522

5190-1523

5190-1524

5190-1525

5190-1526

5190-1527

5190-1528

5190-1529

5190-1530

5190-1531

5190-1532

5190-1533

5190-1534

5190-1535

5190-1536

5190-1537

5190-1538

5190-1539

5190-1540

5190-1541

5190-1542

5190-1543

5190-1544

5190-1545

5190-1546

5190-1547

5190-1548

5190-1549

5190-1550

5190-1558

5190-1559

5190-1563

5190-1565

5190-1571

5190-1572

5190-1573

5190-1574

5190-1575

5190-1576

5190-1577

5190-1581

5190-1599

5190-2238

5190-2239

5190-2240

5190-2241

5190-2242

5190-2243

5190-2257

5190-2258

5190-2277

5190-2278

5190-2279

5190-2280

5190-2281

5190-2282

5190-2283

5190-2285

5190-2286

5190-2287

5190-2288

5190-3155

5190-3188

5190-3189

5190-3190

5190-3191

5190-3192

5190-3193

5190-3984

5190-3985

5190-3989

5190-3990

5190-3991

5190-3992

5190-3993

5190-3995

5190-3996

5190-3997

5190-3999

5190-4002

5190-4003

5190-4004

5190-4005

5190-4048

5190-4061

5190-4062

5190-4063

5190-4064

5190-4065

5190-4066

5190-4067

5965-0027

5965-0028

707-0027

7157-0210

8001-0001

8001-0002

8001-0003

8001-0004

8001-0005

8001-0006

8001-0007

8001-0401

8001-0402

8001-0404

8002-0001

8002-0002

8002-0003

8002-0004

8002-0005

8002-0401

8002-0402

8002-0403

8002-0404

8002-0405

8002-0406

8002-0407

8002-0408

8002-0412

8002-0413

8002-0414

8002-0415

8003-0001

8003-0002

8003-0003

8003-0004

8003-0005

8003-0006

8003-0007

8003-0008

8004-0001

8004-0002

8004-0003

8004-0004

8004-0005

8004-0006

8004-0007

8005-0414

8005-0416

8005-0417

8005-0418

8005-0419

8005-0420

8010-0001

8010-0002

8010-0003

8010-0004

8010-0005

8010-0006

8010-0007

8010-0008

8010-0009

8010-0010

8010-0011

8010-0012

8010-0013

8010-0014

8010-0015

8010-0016

8010-0017

8010-0018

8010-0019

8010-0020

8010-0021

8010-0022

8010-0023

8010-0024

8010-0025

8010-0026

8010-0027

8010-0028

8010-0029

8010-0030

8010-0031

8010-0032

8010-0033

8010-0034

8010-0035

8010-0036

8010-0038

8010-0040

8010-0042

8010-0044

8010-0045

8010-0046

8010-0047

8010-0048

8010-0049

8010-0050

8010-0051

8010-0052

8010-0053

8010-0054

8010-0055

8010-0056

8010-0057

8010-0058

8010-0059

8010-0060

8010-0061

8010-0062

8010-0063

8010-0064

8010-0065

8010-0066

8010-0067

8010-0068

8010-0069

8010-0070

8010-0071

8010-0072

8010-0073

8010-0074

8010-0075

8010-0076

8010-0077

8010-0078

8010-0079

8010-0080

8010-0081

8010-0082

8010-0083

8010-0084

8010-0085

8010-0086

8010-0087

8010-0088

8010-0089

8010-0091

8010-0092

8010-0093

8010-0094

8010-0095

8010-0096

8010-0098

8010-0099

8010-0100

8010-0101

8010-0102

8010-0103

8010-0104

8010-0105

8010-0106

8010-0107

8010-0108

8010-0109

8010-0110

8010-0111

8010-0112

8010-0113

8010-0115

8010-0116

8010-0117

8010-0119

8010-0120

8010-0121

8010-0122

8010-0124

8010-0125

8010-0126

8010-0131

8010-0132

8010-0136

8010-0139

8010-0140

8010-0141

8010-0142

8010-0143

8010-0144

8010-0151

8010-0152

8010-0153

8010-0154

8010-0155

8010-0158

8010-0159

8010-0160

8010-0161

8010-0162

8010-0165

8010-0166

8010-0170

8010-0172

8010-0175

8010-0176

8010-0177

8010-0178

8010-0179

8010-0180

8010-0181

8010-0182

8010-0183

8010-0186

8010-0187

8010-0188

8010-0189

8010-0190

8010-0191

8010-0192

8010-0193

8010-0194

8010-0195

8010-0196

8010-0198

8010-0199

8010-0200

8010-0351

8010-0352

8010-0353

8010-0354

8010-0355

8010-0356

8010-0357

8010-0358

8010-0359

8010-0360

8010-0361

8010-0362

8010-0363

8010-0364

8010-0365

8010-0366

8010-0367

8010-0368

8010-0411

8010-0412

8010-0413

8010-0414

8010-0415

8010-0416

8010-0417

8010-0418

8010-0420

8010-0422

8010-0423

8010-0424

8010-0425

8010-0426

8010-0427

8010-0428

8010-0429

8010-0430

8010-0441

8010-0442

8010-0443

8010-0444

8010-0445

8010-0446

8010-0448

8010-0455

8010-0460

8010-0467

8010-0468

8010-0532

8010-0533

8010-0534

8010-0535

8010-0536

8010-0537

8010-0538

8010-0539

8010-0540

8010-0541

8010-0542

8010-0543

8010-0545

8010-0546

8010-0547

8010-0548

8010-0553

8010-0554

8010-0555

8010-0556

8010-0557

8010-0558

8010-0559

8010-0560

8010-0561

8010-0562

8010-0563

8010-0564

8010-0565

8010-0566

8010-0567

8010-0568

8010-0569

8010-0574

8010-0575

8010-0577

8010-0578

8010-0582

82167-60003

8710-0004

8710-0007

8710-0018

8710-0510

8710-0641

8710-0803

8710-0806

8710-0899

8710-0900

8710-0972

8710-1217

8710-1534

8710-1707

8710-1708

8710-1712

8710-1841

8710-1924

8710-1930

8710-1931

8710-2392

8710-2393

8710-2394

8710-2411

8710-2412

8720-0010

8720-0025

907-0056

9270-0658

9301-0713

9301-0714

9301-0718

9301-0719

9301-0721

9301-0723

9301-0725

9301-0891

9301-0892

9301-0976

9301-0977

9301-0978

9301-0985

9301-1031

9301-1130

9301-1377

9301-1378

9301-1379

9301-1387

9301-1388

9301-1419

9301-1425

AL30509

AL45734

Bill

Bill

BMT-2

BMT-4

BOT-2

CP17969

CP17970

CP17971

CP17971P

CP17972

CP17973

CP17976

CP17977

CP17978

CP17982

CP17983

CP17984

CP17985

CP4013

CP4024

CP4025

CP4026

CP4030

CP4032

CP736520

CP736530

CP738406

CP738407

CP738408

CP741648

CP7978

CP7980

CP7980P4

CP7980P6

CP7981

CP7983

CP7986

CP7986SS

CP7986SS6

CP7987

CP7988

CP7988P3

CP7988P8

CP7989

CP7995

CP82117

CP82117SS

CP82117SS3

G1099-20030

G1103-61611

G1512-60530

G1530-60560

G1530-60570

G1530-60590

G1530-60600

G1530-60610

G1530-60630

G1530-60930

G1530-61580

G1553A

G1680-63715

G1999-80410

G2108A

G2630-80800

G3388B

G3440-60003

G3440-60004

G3440-69003

G3440-80007

G4200-80101

G4200-80102

G4200-80103

G4200-80104

G4200-80105

G4200-80106

G4200-80107

G4200-80108

G4200-80111

G4200-80112

G4200-80113

G4200-80114

G4200-80115

G4200-80116

G4200-80117

G4200-80118

G4200-80119

G4203-68708

G4296-68715

G4383-40000

G4383A

G4384A

G4385A

G4386A

G4387A

G4388-27000

G4388A

G4389A

G4391A

G4392A

G4393A

G4394A

G4395A

G4396A

G4397A

G4398A

G4513-60560

G4513-60561

G4513-80200

G4513-80201

G4513-80202

G4513-80203

G4513-80204

G4513-80205

G4513-80206

G4513-80208

G4513-80209

G4513-80210

G4513-80211

G4513-80212

G4513-80213

G4513-80215

G4513-80216

G4513-80218

G4513-80219

G4513-80220

G4513-80221

G4513-80222

G4513-80223

G4513-80224

G4513-80225

G4513-80226

G4513-80227

G4513-80228

G4513-80229

G4513-80233

G4513-80234

G4513-80235

G4513-80236

G4513-80239

G4513-80240

G4513-80241

G4513-80242

G4513-80243

G4513-80244

G6500-80100

G6500-80101

G6500-80102

G6500-80103

G6500-80104

G6500-80105

G6500-80106

G6500-80107

G6500-80109

G6500-80111

G6500-80113

G6500-80114

G6500-80115

G6500-80116

G6500-80117

G6500-80118

G6500-80119

G6500-80120

G6500-80121

G6500-80122

HMT200-2

HMT200-4

HT200-2

HT200-4

HT3-2

HT3-4

MC-1

OT1-2

OT1-4

OT3-2

OT3-4

RDT-1020

RDT-1023

RFT-2500

RFT-5300

RMP-5005

RMSH-2

RMSH-4

RMSHY-2

RMSHY-4

RMSN-2

RMSN-4

RSI 1200

SWB1021

SWSS20074

SWSS4031

SWSS4041

UMC-5-2

Ordering Information

Easy Ordering Terms and Conditions

Discounts and Delivery

Agilent Technologies specializes in fast delivery. In the US, if you call before 2 PM EST, we will ship your order that day. You may also request overnight express delivery before 6 PM EST and you will have your order the next day. Volume discounts on a variety of individual products are offered when the entire quantity is shipped to one address at one time.

A shipping and handling fee will be added to your order unless the purchase is over $2000 US for orders place online or over $4000 for orders place via phone. Special shipping (i.e., overnight in the US) is available in most regions at an additional cost.

Agilent is required to collect all state and local sales taxes unless the buyer’s tax-exempt certificate is on file with Agilent Technologies. Please be prepared to provide a copy if it is not on file, when placing your order.

Please check with your Agilent Customer Service Representative, local Authorized Distributor, or the Agilent website for current prices, special offers, promotions and discounts when placing your order.

Satisfaction Guaranteed

If you are not satisfied with your Agilent product within the first 60 days, you may return your purchase in its original condition for a full refund or credit. A return policy statement is included in every Agilent shipment and posted under Product Information on the website. In the US and Canada, please call for a Return Authorization form and return instructions at 1-800-227-9770. If your Agilent product was purchased from a distributor, please contact the distributor.

Shipping Damages

If items are damages in transit, please follow the instructions below:

• If a shipment is visibly damaged upon arrival, do not accept it until the person making the delivery has endorsed the bill of lading with statement for the extent of the damage.

• If any damage is found after unpacking, retain all cartons and inner packaging and immediately request an inspection from the carrier.

• Notify the Agilent Customer Contact Center at 1-800-227-9770 about the damaged shipment so that we can make the appropriate sales adjustment and/or provide you with return instructions (Sales order number, product number and quantity damaged will be needed).

Easy Ways To Order

• Phone: 1-800-227-9770 (option 1, 1) in the US and Canada – Mon-Fri, 8AM to 8PM EST

• Fax: 1-302-633-8901 in the US

• Email: cag_sales-na@agilent.com in the US and Canada

• Online: www.agilent.com/chem in the US and Canada

Payment Options

• In the US, Visa, MasterCard, Discover and American Express are accepted with a minimum order of $20 (not applicable in all countries).

• Email ePay@agilent.com to make an electronic payment using the ACH/EFT (Automated Clearing House/Electronic Funds Transfer) method.

• Establish a charge account through your Agilent Customer Service Representative or Your Local Agilent sales office. An account number will be assigned to you for charging your purchases. Payment terms are net 30 days from the invoice date. All orders are subject to credit approval.

We will be happy to supply a price quote via, phone, email or fax if you need it in writing.

Warranties

All Agilent Technologies products in this catalog are designed and manufactured to stringent standards under the Agilent quality system registered to ISO 9001. At Agilent, we back every product with a 90-day warranty and a money-back guarantee. If Agilent receives notice of defects during the warranty period. Agilent shall, at its option, either repair or replace products which prove to be defective. If Agilent is unable, within a reasonable time, to repair or replace any product to a condition as warranted, the buyer shall be entitled to a refund of the purchase price upon return of the product to Agilent. The warranty period for each product begins on the day of shipment.

This warranty shall not apply to any defect, failure, or damage caused by improper use or improper or inadequate maintenance or care. This warranty is exclusive and no other warranty, whether written or oral, is expressed or implied. Agilent specifically disclaims the implied warranties of merchantability and fitness for particular purposes. The remedies provided herein are the buyer’s sole and exclusive remedies. In no event shall Agilent be liable for direct, indirect, special, incidental, or consequential damages (including loss of profits) whether based on contract, tort, or any other legal theory.